LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.11

0

1 2

3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1225 / 7 Constant 3.736 Mean 0.5261E-02 Sigma 0.6086E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8288E-01/ 7 Constant 3.597 Mean 0.2380E-03 Sigma 0.7157E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0 0.25 0.5 0.75 1

0 100 200 300

2012/05/21 13.11

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

2

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.12

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1118E-01/ 7 Constant 2.220 Mean 0.4602E-02 Sigma 0.8126E-02

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1163E-01/ 7 Constant 2.188 Mean -0.3294E-04 Sigma 0.8873E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/05/21 13.12

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.12

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4717 / 7 Constant 16.23 Mean 0.5349E-02 Sigma 0.5948E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3573 / 7 Constant 15.55 Mean 0.2833E-03 Sigma 0.7076E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

2

4

6

0 100 200 300

2012/05/21 13.12

1 0 2.5 5 7.5 10

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

0.5

1

1.5

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.12

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1833E-01/ 7 Constant 3.808 Mean 0.4983E-02 Sigma 0.7523E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2108E-01/ 7 Constant 3.744 Mean 0.8638E-04 Sigma 0.8313E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

0.5

1

0 100 200 300

2012/05/21 13.12

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.13

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4776E-02/ 7 Constant 2.300 Mean 0.4308E-02 Sigma 0.9724E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4704E-02/ 7 Constant 2.281 Mean -0.3502E-03 Sigma 0.1035E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/05/21 13.13

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.13

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5879E-03/ 7 Constant 0.8547 Mean 0.4500E-02 Sigma 0.9768E-02

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2251E-02/ 7 Constant 0.8513 Mean -0.9384E-04 Sigma 0.1034E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/05/21 13.13

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.14

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3952E-03/ 7 Constant 0.5311 Mean 0.3625E-02 Sigma 0.1202E-01

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6075E-03/ 7 Constant 0.5279 Mean -0.1179E-02 Sigma 0.1286E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.005

0.01

0 100 200 300

2012/05/21 13.14

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.14

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1006E-01/ 7 Constant 3.332 Mean 0.4625E-02 Sigma 0.9573E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5359E-02/ 7 Constant 3.306 Mean -0.1062E-03 Sigma 0.1026E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0 0.5 1 1.5 2

0 100 200 300

2012/05/21 13.14

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.15

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2787E-02/ 19 Constant 0.1327 Mean 0.6702E-02 Sigma 0.1686E-01

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3208E-02/ 19 Constant 0.1311 Mean -0.4379E-03 Sigma 0.1783E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0 100 200 300

2012/05/21 13.15

1 0

0.05

0.1

0 100 200 300 2

0 0.025

0.05

0.075 0.1

0 100 200 300 3 0

0.02

0.04

0.06

0 100 200 300 4

0

0.02

0.04

0 100 200 300 5 0

0.01

0.02

0.03

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.15

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1736E-02/ 19 Constant 0.1030 Mean 0.4080E-02 Sigma 0.1860E-01

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1857E-02/ 19 Constant 0.1028 Mean -0.1351E-02 Sigma 0.1887E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0

0.01

0.02

0.03

0 100 200 300

2012/05/21 13.15

1 0

0.05

0.1

0.15

0 100 200 300 2

0

0.1

0.2

0 100 200 300 3 0 0.05 0.1 0.15 0.2

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.15

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6283E-02/ 19 Constant 0.3909 Mean 0.5516E-02 Sigma 0.1799E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6973E-02/ 19 Constant 0.3902 Mean -0.4614E-03 Sigma 0.1821E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/05/21 13.16

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.16

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1227E-01/ 19 Constant 0.6264 Mean 0.6713E-02 Sigma 0.1675E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1489E-01/ 19 Constant 0.6227 Mean -0.2311E-03 Sigma 0.1731E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/05/21 13.16

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0 0.05 0.1 0.15 0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 13.16

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6984E-02/ 19 Constant 0.4468 Mean 0.3353E-02 Sigma 0.1878E-01

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6498E-02/ 19 Constant 0.4471 Mean -0.1386E-02 Sigma 0.1870E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0

0.05

0.1

0 100 200 300

2012/05/21 13.16

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}