LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.06

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1201 / 7 Constant 3.724 Mean 0.5258E-02 Sigma 0.6114E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8101E-01/ 7 Constant 3.588 Mean 0.2343E-03 Sigma 0.7182E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0 0.25 0.5 0.75 1

0 100 200 300

2012/05/21 12.06

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.06

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9916E-02/ 7 Constant 1.857 Mean 0.4636E-02 Sigma 0.8099E-02

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1055E-01/ 7 Constant 1.829 Mean 0.9062E-05 Sigma 0.8846E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/05/21 12.06

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

0 100 200 300 4

0

0.5

1

1.5

2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.07

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4586 / 7 Constant 16.40 Mean 0.5343E-02 Sigma 0.6006E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3412 / 7 Constant 15.74 Mean 0.2700E-03 Sigma 0.7129E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

2

4

6

0 100 200 300

2012/05/21 12.07

1 0 2.5 5 7.5 10

0 100 200 300 2

0

2

4

6

8

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.07

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1790E-01/ 7 Constant 3.839 Mean 0.4974E-02 Sigma 0.7549E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2085E-01/ 7 Constant 3.775 Mean 0.7773E-04 Sigma 0.8342E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

0.5

1

0 100 200 300

2012/05/21 12.07

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.08

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4201E-02/ 7 Constant 1.896 Mean 0.4294E-02 Sigma 0.9594E-02

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3657E-02/ 7 Constant 1.876 Mean -0.3971E-03 Sigma 0.1037E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/05/21 12.08

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5

1 1.5 2

0 100 200 300 5 0 0.2 0.4 0.6 0.8

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.08

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5301E-03/ 7 Constant 0.8636 Mean 0.4472E-02 Sigma 0.9746E-02

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2245E-02/ 7 Constant 0.8567 Mean -0.1073E-03 Sigma 0.1038E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/05/21 12.08

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.09

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3942E-03/ 7 Constant 0.4536 Mean 0.3583E-02 Sigma 0.1202E-01

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5494E-03/ 7 Constant 0.4511 Mean -0.1252E-02 Sigma 0.1284E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.005

0.01

0 100 200 300

2012/05/21 12.09

1 0

0.1

0.2

0.3

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.09

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9913E-02/ 7 Constant 3.358 Mean 0.4583E-02 Sigma 0.9488E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5228E-02/ 7 Constant 3.327 Mean -0.1010E-03 Sigma 0.1029E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0 0.5 1 1.5 2

0 100 200 300

2012/05/21 12.09

1 0

1

2

3

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.09

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2774E-02/ 19 Constant 0.1326 Mean 0.6673E-02 Sigma 0.1688E-01

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3196E-02/ 19 Constant 0.1310 Mean -0.4678E-03 Sigma 0.1786E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0 100 200 300

2012/05/21 12.09

1 0

0.05

0.1

0 100 200 300 2

0 0.025

0.05

0.075 0.1

0 100 200 300 3 0

0.02

0.04

0.06

0.08

0 100 200 300 4

0

0.02

0.04

0 100 200 300 5 0

0.01

0.02

0.03

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.10

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1658E-02/ 19 Constant 0.9863E-01 Mean 0.4161E-02 Sigma 0.1860E-01

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1735E-02/ 19 Constant 0.9842E-01 Mean -0.1367E-02 Sigma 0.1893E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0

0.01

0.02

0.03

0 100 200 300

2012/05/21 12.10

1 0

0.05

0.1

0.15

0 100 200 300 2

0 0.05 0.1 0.15 0.2

0 100 200 300 3 0 0.05 0.1 0.15 0.2

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.10

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6448E-02/ 19 Constant 0.3978 Mean 0.5466E-02 Sigma 0.1795E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7186E-02/ 19 Constant 0.3971 Mean -0.5131E-03 Sigma 0.1819E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/05/21 12.10

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.11

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1219E-01/ 19 Constant 0.6272 Mean 0.6662E-02 Sigma 0.1667E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1471E-01/ 19 Constant 0.6214 Mean -0.2720E-03 Sigma 0.1736E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/05/21 12.11

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0 0.05 0.1 0.15 0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/21 12.11

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6415E-02/ 19 Constant 0.4201 Mean 0.3265E-02 Sigma 0.1880E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6008E-02/ 19 Constant 0.4200 Mean -0.1331E-02 Sigma 0.1867E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0

0.05

0.1

0 100 200 300

2012/05/21 12.11

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0

0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}