LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.34

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1121 / 7 Constant 3.713 Mean 0.5229E-02 Sigma 0.6003E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8390E-01/ 7 Constant 3.568 Mean 0.2104E-03 Sigma 0.7072E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0 0.25 0.5 0.75 1

0 100 200 300

2013/09/23 16.34

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.35

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8102E-02/ 7 Constant 1.951 Mean 0.4916E-02 Sigma 0.8290E-02

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7770E-02/ 7 Constant 1.933 Mean 0.2908E-03 Sigma 0.8809E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.005

0.01

0 100 200 300

2013/09/23 16.35

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.35

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6303 / 7 Constant 15.87 Mean 0.5223E-02 Sigma 0.5895E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5995 / 7 Constant 15.20 Mean 0.1875E-03 Sigma 0.6993E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

2

4

6

0 100 200 300

2013/09/23 16.35

1 0

2.5

5

7.5

10

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.36

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1329E-01/ 7 Constant 3.495 Mean 0.4970E-02 Sigma 0.7606E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2302E-01/ 7 Constant 3.444 Mean 0.1157E-03 Sigma 0.8333E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

0.5

1

0 100 200 300

2013/09/23 16.36

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.36

0

0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3015E-02/ 7 Constant 1.869 Mean 0.4788E-02 Sigma 0.9846E-02

0

0.5

1 1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4045E-02/ 7 Constant 1.854 Mean 0.1243E-03 Sigma 0.1051E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2013/09/23 16.36

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.37

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2229E-02/ 7 Constant 0.8729 Mean 0.4459E-02 Sigma 0.9852E-02

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1333E-02/ 7 Constant 0.8660 Mean -0.2849E-03 Sigma 0.1059E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.1 0.2 0.3 0.4

0 100 200 300

2013/09/23 16.37

1 0

0.2 0.4

0.6

0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0.2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.37

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6978E-03/ 7 Constant 0.4324 Mean 0.4013E-02 Sigma 0.1272E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7192E-03/ 7 Constant 0.4350 Mean -0.9360E-03 Sigma 0.1258E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.0025

0.005

0.0075

0.01

0 100 200 300

2013/09/23 16.37

1 0

0.1

0.2

0.3

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.37

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7786E-02/ 7 Constant 3.229 Mean 0.4237E-02 Sigma 0.9313E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9614E-02/ 7 Constant 3.201 Mean -0.4817E-03 Sigma 0.9961E-02

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0 0.5 1 1.5 2

0 100 200 300

2013/09/23 16.37

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.38

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3568E-02/ 19 Constant 0.1341 Mean 0.5742E-02 Sigma 0.1718E-01

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3898E-02/ 19 Constant 0.1325 Mean -0.1455E-02 Sigma 0.1837E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0 100 200 300

2013/09/23 16.38

1 0

0.05

0.1

0.15

0 100 200 300 2

0 0.025

0.05

0.075 0.1

0 100 200 300 3 0 0.02

0.04

0.06

0.08

0 100 200 300 4

0

0.02

0.04

0 100 200 300 5 0

0.01

0.02

0.03

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.38

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1161E-02/ 19 Constant 0.9582E-01 Mean 0.3519E-02 Sigma 0.1940E-01

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1242E-02/ 19 Constant 0.9593E-01 Mean -0.2147E-02 Sigma 0.1987E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0

0.01

0.02

0.03

0 100 200 300

2013/09/23 16.38

1 0

0.05

0.1

0 100 200 300 2

0

0.1

0.2

0 100 200 300 3 0 0.05 0.1 0.15 0.2

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.39

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9185E-02/ 19 Constant 0.3613 Mean 0.4617E-02 Sigma 0.1794E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1131E-01/ 19 Constant 0.3600 Mean -0.1301E-02 Sigma 0.1841E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0

0.2

0.4

0.6

0 100 200 300

2013/09/23 16.39

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.39

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1705E-01/ 19 Constant 0.5986 Mean 0.5379E-02 Sigma 0.1663E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1736E-01/ 19 Constant 0.5913 Mean -0.1916E-02 Sigma 0.1793E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

0 100 200 300

2013/09/23 16.39

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0 0.05 0.1 0.15 0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/09/23 16.40

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6168E-02/ 19 Constant 0.3727 Mean 0.2561E-02 Sigma 0.1962E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7141E-02/ 19 Constant 0.3721 Mean -0.2159E-02 Sigma 0.1952E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

0 100 200 300

2013/09/23 16.40

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}