LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.20

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1155 / 7 Constant 3.723 Mean 0.5208E-02 Sigma 0.6166E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7677E-01/ 7 Constant 3.590 Mean 0.1714E-03 Sigma 0.7233E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0 0.25 0.5 0.75 1

0 100 200 300

2012/04/03 15.20

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.20

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1045E-01/ 7 Constant 1.809 Mean 0.4562E-02 Sigma 0.8094E-02

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1133E-01/ 7 Constant 1.782 Mean -0.1236E-03 Sigma 0.8814E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/04/03 15.21

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

0 100 200 300 4

0

0.5

1

1.5

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.21

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4435 / 7 Constant 16.43 Mean 0.5325E-02 Sigma 0.6064E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3254 / 7 Constant 15.78 Mean 0.2349E-03 Sigma 0.7192E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

2

4

0 100 200 300

2012/04/03 15.21

1 0 2.5 5 7.5 10

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.21

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1598E-01/ 7 Constant 3.829 Mean 0.4970E-02 Sigma 0.7640E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1949E-01/ 7 Constant 3.765 Mean 0.7723E-04 Sigma 0.8443E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

0.5

1

0 100 200 300

2012/04/03 15.21

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.22

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4363E-02/ 7 Constant 2.033 Mean 0.4380E-02 Sigma 0.9723E-02

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3538E-02/ 7 Constant 2.019 Mean -0.2907E-03 Sigma 0.1039E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/04/03 15.22

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.22

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5396E-03/ 7 Constant 0.8711 Mean 0.4363E-02 Sigma 0.9758E-02

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2282E-02/ 7 Constant 0.8685 Mean -0.1907E-03 Sigma 0.1036E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/04/03 15.22

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.23

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4131E-03/ 7 Constant 0.4559 Mean 0.3370E-02 Sigma 0.1196E-01

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5314E-03/ 7 Constant 0.4534 Mean -0.1466E-02 Sigma 0.1280E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.005

0.01

0 100 200 300

2012/04/03 15.23

1 0

0.1

0.2

0.3

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.23

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9705E-02/ 7 Constant 3.382 Mean 0.4527E-02 Sigma 0.9511E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5148E-02/ 7 Constant 3.348 Mean -0.1687E-03 Sigma 0.1032E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

0.5 1

1.5 2

0 100 200 300

2012/04/03 15.23

1 0

1

2

3

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.23

0

0.05

0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2743E-02/ 19 Constant 0.1153 Mean 0.7846E-02 Sigma 0.1680E-01

0

0.05

0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2989E-02/ 19 Constant 0.1141 Mean 0.6845E-03 Sigma 0.1780E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0 100 200 300

2012/04/03 15.24

1 0

0.05

0.1

0 100 200 300 2

0 0.02

0.04

0.06

0.08

0 100 200 300 3 0

0.02

0.04

0.06

0 100 200 300 4

0

0.01

0.02

0.03

0.04

0 100 200 300 5 0 0.005

0.01

0.015

0.02

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.24

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1695E-02/ 19 Constant 0.1013 Mean 0.5863E-02 Sigma 0.1874E-01

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1808E-02/ 19 Constant 0.1011 Mean 0.4025E-03 Sigma 0.1904E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0

0.01

0.02

0.03

0 100 200 300

2012/04/03 15.24

1 0

0.05

0.1

0.15

0 100 200 300 2

0

0.1

0.2

0 100 200 300 3 0

0.1

0.2

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.24

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6039E-02/ 19 Constant 0.3999 Mean 0.6425E-02 Sigma 0.1791E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7127E-02/ 19 Constant 0.3983 Mean 0.5559E-03 Sigma 0.1819E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/04/03 15.24

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.25

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1193E-01/ 19 Constant 0.5690 Mean 0.7325E-02 Sigma 0.1671E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1465E-01/ 19 Constant 0.5652 Mean 0.4061E-03 Sigma 0.1736E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/04/03 15.25

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.025

0.05

0.075 0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/03 15.25

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7134E-02/ 19 Constant 0.4254 Mean 0.4702E-02 Sigma 0.1895E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7054E-02/ 19 Constant 0.4254 Mean -0.8105E-05 Sigma 0.1892E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0

0.05

0.1

0 100 200 300

2012/04/03 15.25

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}