LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.11

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1152 / 7 Constant 3.768 Mean 0.5205E-02 Sigma 0.6189E-02

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4911E-01/ 6 Constant 3.671 Mean -0.9099E-04 Sigma 0.6848E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^-

0

0.25 0.5

0.75 1

0 100 200 300

2012/03/28 20.11

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0 0.5 1

1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.11

5

0

0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1098E-01/ 7 Constant 1.862 Mean 0.4575E-02 Sigma 0.8108E-02

0

0.5 1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6281E-02/ 6 Constant 1.850 Mean -0.2575E-03 Sigma 0.8359E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^-

0

0.005

0.01

0.015

0 100 200 300

2012/03/28 20.12

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

0 100 200 300 4

0

0.5

1

1.5

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.12

5

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4437 / 7 Constant 16.22 Mean 0.5322E-02 Sigma 0.6051E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1688 / 6 Constant 15.80 Mean -0.4136E-04 Sigma 0.6697E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^-

0

2

4

0 100 200 300

2012/03/28 20.12

1 0 2.5 5 7.5 10

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

2

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.12

5

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2137E-01/ 7 Constant 5.430 Mean 0.5169E-02 Sigma 0.7701E-02

0

2

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9723E-02/ 6 Constant 5.379 Mean 0.1189E-03 Sigma 0.8093E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^-

0

0.5

1

1.5

0 100 200 300

2012/03/28 20.12

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0

0.5

1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.13

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7349E-02/ 7 Constant 3.820 Mean 0.4866E-02 Sigma 0.9864E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4475E-02/ 6 Constant 3.804 Mean 0.1152E-03 Sigma 0.1013E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^-

0

0.01

0.02

0 100 200 300

2012/03/28 20.13

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

0 100 200 300 5 0

1

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.13

6

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5176E-03/ 7 Constant 0.9185 Mean 0.4244E-02 Sigma 0.9900E-02

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1021E-02/ 6 Constant 0.9171 Mean -0.5140E-03 Sigma 0.9928E-02

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^-

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/03/28 20.13

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0 0.05 0.1 0.15 0.2

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.14

5

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5289E-03/ 7 Constant 0.4520 Mean 0.3048E-02 Sigma 0.1207E-01

0

0.2

0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8519E-03/ 6 Constant 0.4589 Mean -0.1690E-02 Sigma 0.1108E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^-

0 0.0025

0.005

0.0075

0.01

0 100 200 300

2012/03/28 20.14

1 0

0.1

0.2

0.3

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.14

5

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9162E-02/ 7 Constant 3.455 Mean 0.4479E-02 Sigma 0.9596E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3754E-02/ 6 Constant 3.431 Mean -0.3186E-03 Sigma 0.1009E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^-

0

0.5

1

1.5

0 100 200 300

2012/03/28 20.14

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300

5 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.15

5

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1026E-02/ 16 Constant 0.1456 Mean 0.6031E-02 Sigma 0.1595E-01

0

0.05

0.1

0.15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3862E-03/ 13 Constant 0.1471 Mean -0.1163E-02 Sigma 0.1534E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^-

0

0.05

0.1

0 100 200 300

2012/03/28 20.15

1 0

0.05

0.1

0.15

0 100 200 300 2

0 0.025

0.05

0.075 0.1

0 100 200 300 3 0 0.02

0.04

0.06

0.08

0 100 200 300 4

0

0.02

0.04

0.06

0 100 200 300 5 0 0.01

0.02

0.03

0.04

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.15

6

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6236E-03/ 16 Constant 0.1040 Mean 0.3658E-02 Sigma 0.1728E-01

0 0.025

0.05

0.075 0.1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3311E-03/ 13 Constant 0.1049 Mean -0.2179E-02 Sigma 0.1706E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^-

0

0.01

0.02

0.03

0 100 200 300

2012/03/28 20.15

1 0

0.05

0.1

0 100 200 300 2

0 0.05 0.1 0.15 0.2

0 100 200 300 3 0 0.05 0.1 0.15 0.2

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0 0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.16

6

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3653E-02/ 16 Constant 0.4013 Mean 0.5097E-02 Sigma 0.1699E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3059E-02/ 13 Constant 0.4026 Mean -0.1151E-02 Sigma 0.1644E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/03/28 20.16

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.16

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4312E-02/ 16 Constant 0.6403 Mean 0.6393E-02 Sigma 0.1573E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2847E-02/ 13 Constant 0.6442 Mean -0.6606E-03 Sigma 0.1519E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^-

0

0.2

0.4

0.6

0 100 200 300

2012/03/28 20.16

1 0

0.2

0.4

0.6

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0 0.05 0.1 0.15 0.2

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/28 20.17

6

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3541E-02/ 16 Constant 0.4234 Mean 0.3098E-02 Sigma 0.1824E-01

0 0.1 0.2 0.3 0.4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1851E-02/ 13 Constant 0.4272 Mean -0.1622E-02 Sigma 0.1714E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^-

0

0.05

0.1

0 100 200 300

2012/03/28 20.17

1 0

0.2

0.4

0.6

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}