LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.20

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7874E-01/ 7 Constant 3.410 Mean 0.4305E-02 Sigma 0.6861E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6839E-01/ 7 Constant 3.345 Mean 0.1593E-03 Sigma 0.7461E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

0.25

0.5

0.75

1

0 100 200 300

2012/05/03 15.20

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.20

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3949E-01/ 7 Constant 3.068 Mean 0.4164E-02 Sigma 0.7492E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4101E-01/ 7 Constant 3.034 Mean 0.1674E-03 Sigma 0.7926E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0 100 200 300

2012/05/03 15.20

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1

0.2

0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.20

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1079E-01/ 7 Constant 2.421 Mean 0.4097E-02 Sigma 0.9133E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9562E-02/ 7 Constant 2.416 Mean 0.2305E-03 Sigma 0.9348E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/05/03 15.21

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.21

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2476 / 7 Constant 14.50 Mean 0.4350E-02 Sigma 0.6856E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3311 / 7 Constant 14.28 Mean 0.1827E-03 Sigma 0.7360E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

0 100 200 300

2012/05/03 15.21

1 0 2 4 6 8

0 100 200 300 2

0

2.5

5

7.5

10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.21

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3922 / 7 Constant 17.49 Mean 0.4373E-02 Sigma 0.6681E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3356 / 7 Constant 17.07 Mean 0.9552E-04 Sigma 0.7378E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/05/03 15.21

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.22

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2186 / 7 Constant 14.28 Mean 0.4119E-02 Sigma 0.7686E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1970 / 7 Constant 14.14 Mean 0.1101E-03 Sigma 0.8097E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

0 100 200 300

2012/05/03 15.22

1 0

5

10

0 100 200 300 2

0

5

10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

0.5

1

1.5

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.22

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2351E-01/ 7 Constant 9.811 Mean 0.5110E-02 Sigma 0.8600E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4317E-01/ 7 Constant 9.733 Mean 0.3618E-03 Sigma 0.9202E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/05/03 15.22

1 0 0.5 1 1.5 2

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0 2 4 6 8

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.23

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1602E-01/ 7 Constant 3.706 Mean 0.4186E-02 Sigma 0.8267E-02

0

1 2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1655E-01/ 7 Constant 3.683 Mean 0.2512E-03 Sigma 0.8595E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

0 100 200 300

2012/05/03 15.23

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.23

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5464E-02/ 7 Constant 2.616 Mean 0.3812E-02 Sigma 0.1042E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6897E-02/ 7 Constant 2.612 Mean 0.1871E-03 Sigma 0.1055E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/05/03 15.23

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.24

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4989E-01/ 7 Constant 7.407 Mean 0.3882E-02 Sigma 0.9189E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4057E-01/ 7 Constant 7.380 Mean 0.2217E-03 Sigma 0.9392E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2012/05/03 15.24

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.24

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4330E-01/ 7 Constant 10.65 Mean 0.4093E-02 Sigma 0.8215E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6697E-01/ 7 Constant 10.60 Mean 0.2979E-03 Sigma 0.8457E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 1 2 3 4

0 100 200 300

2012/05/03 15.24

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

1

2

3

4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.24

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1747E-01/ 7 Constant 6.756 Mean 0.3713E-02 Sigma 0.1051E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1864E-01/ 7 Constant 6.747 Mean 0.3404E-03 Sigma 0.1062E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/05/03 15.24

1 0

0.5

1

1.5

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0 2.5 5 7.5 10

0 100 200 300 4

0 2 4 6 8

0 100 200 300 5 0

2

4

6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.25

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1829E-02/ 7 Constant 0.9460 Mean 0.3821E-02 Sigma 0.1051E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2138E-02/ 7 Constant 0.9376 Mean 0.5498E-04 Sigma 0.1103E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/05/03 15.25

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.25

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8380E-03/ 7 Constant 0.7070 Mean 0.3577E-02 Sigma 0.1274E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6950E-03/ 7 Constant 0.7073 Mean 0.1955E-03 Sigma 0.1275E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0 100 200 300

2012/05/03 15.25

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.26

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8171E-02/ 7 Constant 2.548 Mean 0.3356E-02 Sigma 0.1079E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8146E-02/ 7 Constant 2.549 Mean 0.4936E-05 Sigma 0.1072E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2012/05/03 15.26

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.26

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7778E-02/ 7 Constant 3.911 Mean 0.3706E-02 Sigma 0.1039E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8102E-02/ 7 Constant 3.915 Mean 0.3653E-03 Sigma 0.1040E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/05/03 15.26

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.27

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2465E-02/ 7 Constant 2.499 Mean 0.3716E-02 Sigma 0.1203E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2078E-02/ 7 Constant 2.493 Mean 0.7395E-04 Sigma 0.1228E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/05/03 15.27

1 0

0.5

1

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.27

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5251E-02/ 19 Constant 0.2150 Mean 0.6692E-02 Sigma 0.1770E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5388E-02/ 19 Constant 0.2130 Mean 0.2223E-03 Sigma 0.1848E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.05

0.1

0.15

0.2

0 100 200 300

2012/05/03 15.27

1 0 0.05 0.1 0.15 0.2

0 100 200 300 2

0

0.05

0.1

0.15

0.2

0 100 200 300 3 0

0.05

0.1

0.15

0 100 200 300 4

0 0.025

0.05

0.075 0.1

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.28

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3678E-02/ 19 Constant 0.1966 Mean 0.4948E-02 Sigma 0.1945E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3179E-02/ 19 Constant 0.1973 Mean 0.6916E-03 Sigma 0.1903E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/05/03 15.28

1 0

0.1

0.2

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.28

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7932E-02/ 19 Constant 0.6403 Mean 0.5566E-02 Sigma 0.1863E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9007E-02/ 19 Constant 0.6404 Mean 0.4830E-03 Sigma 0.1871E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2012/05/03 15.28

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.29

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2288E-01/ 19 Constant 0.8742 Mean 0.6924E-02 Sigma 0.1718E-01

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2364E-01/ 19 Constant 0.8645 Mean 0.1557E-04 Sigma 0.1814E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25

0.5 0.75 1

0 100 200 300

2012/05/03 15.29

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.2

0.4

0.6

0.8

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/05/03 15.29

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1916E-01/ 19 Constant 0.6951 Mean 0.4152E-02 Sigma 0.2051E-01

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1544E-01/ 19 Constant 0.7027 Mean 0.9534E-03 Sigma 0.1899E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.05

0.1

0.15

0 100 200 300

2012/05/03 15.29

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}