LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.42

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9245E-01/ 7 Constant 3.934 Mean 0.4199E-02 Sigma 0.6833E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5095E-01/ 6 Constant 3.914 Mean -0.1968E-03 Sigma 0.6938E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2012/03/12 13.42

1 0

1

2

3

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.43

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4685E-01/ 7 Constant 3.509 Mean 0.4004E-02 Sigma 0.7450E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2811E-01/ 6 Constant 3.519 Mean -0.2140E-03 Sigma 0.7311E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0.6

0 100 200 300

2012/03/12 13.43

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.43

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1334E-01/ 7 Constant 2.518 Mean 0.3775E-02 Sigma 0.8963E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7291E-02/ 6 Constant 2.520 Mean -0.1736E-03 Sigma 0.8792E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/12 13.44

1 0

0.2

0.4

0.6

0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.44

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2563 / 7 Constant 15.26 Mean 0.4292E-02 Sigma 0.6866E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1735 / 6 Constant 15.26 Mean -0.1678E-03 Sigma 0.6830E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

0 100 200 300

2012/03/12 13.44

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0

1

2

3

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.44

6

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4338 / 7 Constant 19.08 Mean 0.4330E-02 Sigma 0.6686E-02

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1630 / 6 Constant 18.92 Mean -0.2385E-03 Sigma 0.6848E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/03/12 13.44

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.45

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2498 / 7 Constant 15.94 Mean 0.4020E-02 Sigma 0.7632E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1673 / 6 Constant 15.89 Mean -0.1839E-03 Sigma 0.7669E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

3

0 100 200 300

2012/03/12 13.45

1 0

5

10

15

0 100 200 300 2

0

5

10

15

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.45

6

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2564E-01/ 7 Constant 10.72 Mean 0.4928E-02 Sigma 0.8470E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1324E-01/ 6 Constant 10.69 Mean -0.5097E-04 Sigma 0.8584E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/03/12 13.45

1 0 0.5 1 1.5 2

0 100 200 300 2

0

5

10

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0

5

10

0 100 200 300 5 0

2

4

6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.46

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1894E-01/ 7 Constant 4.194 Mean 0.3899E-02 Sigma 0.8238E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7756E-02/ 6 Constant 4.201 Mean -0.1557E-03 Sigma 0.8116E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

1.5

0 100 200 300

2012/03/12 13.46

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.46

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5591E-02/ 7 Constant 2.732 Mean 0.3430E-02 Sigma 0.1051E-01

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3186E-02/ 6 Constant 2.748 Mean -0.1468E-03 Sigma 0.1006E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/03/12 13.46

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.47

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5550E-01/ 7 Constant 7.842 Mean 0.3618E-02 Sigma 0.9079E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2674E-01/ 6 Constant 7.875 Mean -0.2075E-03 Sigma 0.8762E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2012/03/12 13.47

1 0

2

4

6

0 100 200 300 2

0

2

4

6

8

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.47

6

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5262E-01/ 7 Constant 12.97 Mean 0.3776E-02 Sigma 0.8167E-02

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4191E-01/ 6 Constant 12.99 Mean -0.1784E-03 Sigma 0.8014E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

2

4

0 100 200 300

2012/03/12 13.47

1 0 2 4 6 8

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.48

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2192E-01/ 7 Constant 7.501 Mean 0.3241E-02 Sigma 0.1043E-01

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1223E-01/ 6 Constant 7.517 Mean -0.1239E-03 Sigma 0.1009E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0.06

0 100 200 300

2012/03/12 13.48

1 0 0.5

1 1.5 2

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0

5

10

0 100 200 300 4

0 2.5

5

7.5 10

0 100 200 300 5 0

2

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.48

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2054E-02/ 7 Constant 0.9741 Mean 0.3536E-02 Sigma 0.1046E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6955E-03/ 6 Constant 0.9771 Mean -0.2013E-03 Sigma 0.1003E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0

0.2

0.4

0 100 200 300

2012/03/12 13.48

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0 0.025

0.05

0.075 0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.49

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6963E-03/ 7 Constant 0.6818 Mean 0.3092E-02 Sigma 0.1278E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4948E-03/ 6 Constant 0.6902 Mean 0.2478E-03 Sigma 0.1168E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/12 13.49

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.49

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8399E-02/ 7 Constant 2.451 Mean 0.3158E-02 Sigma 0.1065E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3958E-02/ 6 Constant 2.463 Mean -0.1732E-03 Sigma 0.1028E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2012/03/12 13.49

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.50

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7994E-02/ 7 Constant 3.880 Mean 0.3458E-02 Sigma 0.1029E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6021E-02/ 6 Constant 3.889 Mean -0.1368E-03 Sigma 0.1009E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/03/12 13.50

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.50

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2575E-02/ 7 Constant 2.386 Mean 0.3256E-02 Sigma 0.1209E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3775E-02/ 6 Constant 2.393 Mean 0.8072E-04 Sigma 0.1198E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0.04

0 100 200 300

2012/03/12 13.50

1 0

0.5

1

1.5

0 100 200 300 2

0

2

4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.51

6

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1979E-02/ 16 Constant 0.2224 Mean 0.5422E-02 Sigma 0.1645E-01

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5043E-03/ 13 Constant 0.2254 Mean -0.5192E-03 Sigma 0.1531E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0 0.05 0.1

0.15 0.2

0 100 200 300

2012/03/12 13.51

1 0 0.05 0.1 0.15 0.2

0 100 200 300 2

0

0.05

0.1

0.15

0 100 200 300 3 0

0.05

0.1

0 100 200 300 4

0 0.025

0.05

0.075 0.1

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.51

6

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1139E-02/ 16 Constant 0.1943 Mean 0.3767E-02 Sigma 0.1796E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6648E-03/ 13 Constant 0.1949 Mean -0.7874E-04 Sigma 0.1729E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/03/12 13.51

1 0

0.1

0.2

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.52

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5909E-02/ 16 Constant 0.6383 Mean 0.4212E-02 Sigma 0.1805E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4024E-02/ 13 Constant 0.6465 Mean -0.4574E-03 Sigma 0.1644E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2012/03/12 13.52

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0.8

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.52

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1248E-01/ 16 Constant 0.9411 Mean 0.5200E-02 Sigma 0.1620E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6371E-02/ 13 Constant 0.9486 Mean -0.2672E-03 Sigma 0.1536E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2012/03/12 13.52

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.1

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.2 0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/12 13.53

6

0

0.2

0.4 0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9257E-02/ 16 Constant 0.7116 Mean 0.2494E-02 Sigma 0.1920E-01

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3834E-02/ 13 Constant 0.7267 Mean -0.2325E-03 Sigma 0.1622E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

0 100 200 300

2012/03/12 13.53

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}