LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.43

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7968E-01/ 7 Constant 3.367 Mean 0.4288E-02 Sigma 0.6806E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7262E-01/ 7 Constant 3.308 Mean 0.1245E-03 Sigma 0.7342E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2013/07/29 07.43

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300 5 0

0.1

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.44

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4558E-01/ 7 Constant 3.045 Mean 0.4183E-02 Sigma 0.7517E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3725E-01/ 7 Constant 3.009 Mean 0.1426E-03 Sigma 0.7973E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0 100 200 300

2013/07/29 07.44

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.44

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7995E-02/ 7 Constant 2.385 Mean 0.4041E-02 Sigma 0.8957E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1121E-01/ 7 Constant 2.373 Mean 0.2050E-03 Sigma 0.9279E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2013/07/29 07.44

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.45

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2099 / 7 Constant 13.63 Mean 0.4444E-02 Sigma 0.7071E-02

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1822 / 7 Constant 13.47 Mean 0.1932E-03 Sigma 0.7507E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

0 100 200 300

2013/07/29 07.45

1 0 2 4 6 8

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0

1 2

3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.45

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6146 / 7 Constant 17.27 Mean 0.4364E-02 Sigma 0.6633E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4819 / 7 Constant 16.91 Mean 0.9071E-04 Sigma 0.7258E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2013/07/29 07.45

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.46

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2458 / 7 Constant 14.30 Mean 0.4024E-02 Sigma 0.7702E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2305 / 7 Constant 14.17 Mean 0.8375E-05 Sigma 0.8075E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

0 100 200 300

2013/07/29 07.46

1 0

5

10

0 100 200 300 2

0

5

10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.46

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7592E-01/ 7 Constant 9.901 Mean 0.5140E-02 Sigma 0.8283E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7156E-01/ 7 Constant 9.847 Mean 0.2481E-03 Sigma 0.8605E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0.06

0 100 200 300

2013/07/29 07.46

1 0 0.5 1 1.5 2

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0 2 4 6 8

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.46

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1932E-01/ 7 Constant 3.681 Mean 0.4346E-02 Sigma 0.8208E-02

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2187E-01/ 7 Constant 3.661 Mean 0.4622E-03 Sigma 0.8503E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

0 100 200 300

2013/07/29 07.47

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.47

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5930E-02/ 7 Constant 2.752 Mean 0.3841E-02 Sigma 0.1039E-01

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4036E-02/ 7 Constant 2.746 Mean 0.2533E-03 Sigma 0.1052E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

0.01

0.02

0 100 200 300

2013/07/29 07.47

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

1

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.47

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7199E-01/ 7 Constant 7.327 Mean 0.4298E-02 Sigma 0.9026E-02

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7033E-01/ 7 Constant 7.298 Mean 0.6620E-03 Sigma 0.9263E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2013/07/29 07.48

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.48

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5908E-01/ 7 Constant 10.38 Mean 0.4354E-02 Sigma 0.8144E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6200E-01/ 7 Constant 10.34 Mean 0.5560E-03 Sigma 0.8359E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 1 2 3 4

0 100 200 300

2013/07/29 07.48

1 0 2 4 6 8

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.48

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1690E-01/ 7 Constant 6.963 Mean 0.4028E-02 Sigma 0.1073E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2052E-01/ 7 Constant 6.962 Mean 0.6733E-03 Sigma 0.1077E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2013/07/29 07.48

1 0

0.5

1

1.5

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

5

10

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0

2

4

6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.49

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1443E-02/ 7 Constant 0.9137 Mean 0.3739E-02 Sigma 0.1070E-01

0

0.25

0.5

0.75

1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1024E-02/ 7 Constant 0.9125 Mean -0.5150E-04 Sigma 0.1095E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.1 0.2 0.3 0.4

0 100 200 300

2013/07/29 07.49

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.49

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6740E-03/ 7 Constant 0.6684 Mean 0.3641E-02 Sigma 0.1275E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5914E-03/ 7 Constant 0.6676 Mean 0.2167E-03 Sigma 0.1272E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0 100 200 300

2013/07/29 07.49

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.50

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7757E-02/ 7 Constant 2.353 Mean 0.3394E-02 Sigma 0.1143E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8019E-02/ 7 Constant 2.351 Mean 0.7084E-04 Sigma 0.1145E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2013/07/29 07.50

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.50

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6473E-02/ 7 Constant 3.859 Mean 0.3505E-02 Sigma 0.1003E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6439E-02/ 7 Constant 3.863 Mean 0.1791E-03 Sigma 0.9996E-02

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 0.5 1 1.5 2

0 100 200 300

2013/07/29 07.50

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0

0.25

0.5

0.75

1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.51

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3679E-02/ 7 Constant 2.362 Mean 0.3750E-02 Sigma 0.1263E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1424E-02/ 7 Constant 2.345 Mean 0.1601E-03 Sigma 0.1337E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2013/07/29 07.51

1 0

0.5

1

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.51

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5945E-02/ 19 Constant 0.2025 Mean 0.6695E-02 Sigma 0.1782E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4896E-02/ 19 Constant 0.2008 Mean 0.1343E-03 Sigma 0.1864E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.05

0.1

0.15

0 100 200 300

2013/07/29 07.51

1 0 0.05 0.1 0.15 0.2

0 100 200 300 2

0

0.05

0.1

0.15

0 100 200 300 3 0

0.05

0.1

0.15

0 100 200 300 4

0 0.025

0.05

0.075 0.1

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.52

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2243E-02/ 19 Constant 0.1828 Mean 0.4791E-02 Sigma 0.1979E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2295E-02/ 19 Constant 0.1831 Mean 0.5641E-03 Sigma 0.1944E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2013/07/29 07.52

1 0

0.1

0.2

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.52

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1726E-01/ 19 Constant 0.5939 Mean 0.5565E-02 Sigma 0.1854E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1654E-01/ 19 Constant 0.5937 Mean 0.5136E-03 Sigma 0.1856E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

0.8

0 100 200 300

2013/07/29 07.52

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.53

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2664E-01/ 19 Constant 0.8305 Mean 0.6789E-02 Sigma 0.1726E-01

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2725E-01/ 19 Constant 0.8200 Mean -0.1879E-03 Sigma 0.1845E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2013/07/29 07.53

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2013/07/29 07.53

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1106E-01/ 19 Constant 0.6618 Mean 0.4402E-02 Sigma 0.1961E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1026E-01/ 19 Constant 0.6679 Mean 0.1064E-02 Sigma 0.1849E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.05

0.1

0.15

0 100 200 300

2013/07/29 07.53

1 0

0.25 0.5 0.75

1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}