LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.33

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8065E-01/ 7 Constant 3.433 Mean 0.4279E-02 Sigma 0.6841E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7002E-01/ 7 Constant 3.368 Mean 0.1289E-03 Sigma 0.7439E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2012/04/10 15.33

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

2

0 100 200 300 3 0

0.25

0.5

0.75

1

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.33

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4055E-01/ 7 Constant 3.114 Mean 0.4124E-02 Sigma 0.7481E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4206E-01/ 7 Constant 3.086 Mean 0.1405E-03 Sigma 0.7885E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0 100 200 300

2012/04/10 15.33

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.34

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1123E-01/ 7 Constant 2.446 Mean 0.4022E-02 Sigma 0.9106E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9940E-02/ 7 Constant 2.441 Mean 0.1568E-03 Sigma 0.9326E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/04/10 15.34

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.34

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2484 / 7 Constant 14.20 Mean 0.4342E-02 Sigma 0.6832E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3311 / 7 Constant 13.99 Mean 0.1733E-03 Sigma 0.7330E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

0 100 200 300

2012/04/10 15.34

1 0 2 4 6 8

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

6

8

0 100 200 300 4

0

2

4

0 100 200 300 5 0

1

2

3

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.35

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4049 / 7 Constant 17.56 Mean 0.4359E-02 Sigma 0.6655E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3448 / 7 Constant 17.14 Mean 0.7743E-04 Sigma 0.7350E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/04/10 15.35

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.35

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2268 / 7 Constant 14.53 Mean 0.4086E-02 Sigma 0.7666E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2035 / 7 Constant 14.38 Mean 0.7432E-04 Sigma 0.8080E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

0 100 200 300

2012/04/10 15.35

1 0

5

10

0 100 200 300 2

0

5

10

0 100 200 300 3 0

2

4

6

8

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.35

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2393E-01/ 7 Constant 10.07 Mean 0.5059E-02 Sigma 0.8571E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4416E-01/ 7 Constant 9.982 Mean 0.3025E-03 Sigma 0.9179E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/04/10 15.35

1 0 0.5 1 1.5 2

0 100 200 300 2

0

5

10

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0 2 4 6 8

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

1 2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.36

0

1

2 3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1633E-01/ 7 Constant 3.715 Mean 0.4156E-02 Sigma 0.8255E-02

0 1 2

3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1679E-01/ 7 Constant 3.694 Mean 0.2174E-03 Sigma 0.8576E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

0 100 200 300

2012/04/10 15.36

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.36

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5563E-02/ 7 Constant 2.670 Mean 0.3737E-02 Sigma 0.1042E-01

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6934E-02/ 7 Constant 2.663 Mean 0.1074E-03 Sigma 0.1058E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/04/10 15.36

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.37

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4859E-01/ 7 Constant 7.193 Mean 0.3853E-02 Sigma 0.9176E-02

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3932E-01/ 7 Constant 7.167 Mean 0.1913E-03 Sigma 0.9380E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2012/04/10 15.37

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.37

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4402E-01/ 7 Constant 10.73 Mean 0.4063E-02 Sigma 0.8193E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6806E-01/ 7 Constant 10.68 Mean 0.2653E-03 Sigma 0.8438E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 1 2 3 4

0 100 200 300

2012/04/10 15.37

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.38

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1809E-01/ 7 Constant 6.965 Mean 0.3626E-02 Sigma 0.1051E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1922E-01/ 7 Constant 6.960 Mean 0.2475E-03 Sigma 0.1063E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/04/10 15.38

1 0

0.5

1

1.5

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

5

10

0 100 200 300 4

0

2.5

5

7.5

10

0 100 200 300 5 0

2

4

6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.38

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1897E-02/ 7 Constant 0.9437 Mean 0.3757E-02 Sigma 0.1049E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2086E-02/ 7 Constant 0.9387 Mean 0.2520E-04 Sigma 0.1091E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/04/10 15.38

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.39

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8030E-03/ 7 Constant 0.7145 Mean 0.3461E-02 Sigma 0.1275E-01

0

0.2

0.4

0.6

0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6689E-03/ 7 Constant 0.7147 Mean 0.7866E-04 Sigma 0.1275E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/04/10 15.39

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.39

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8084E-02/ 7 Constant 2.500 Mean 0.3302E-02 Sigma 0.1079E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8023E-02/ 7 Constant 2.501 Mean -0.1763E-04 Sigma 0.1076E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2012/04/10 15.39

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.39

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7832E-02/ 7 Constant 3.919 Mean 0.3653E-02 Sigma 0.1036E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8158E-02/ 7 Constant 3.912 Mean 0.3216E-03 Sigma 0.1042E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/04/10 15.40

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.40

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2559E-02/ 7 Constant 2.551 Mean 0.3607E-02 Sigma 0.1204E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2132E-02/ 7 Constant 2.544 Mean -0.4699E-04 Sigma 0.1231E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/04/10 15.40

1 0

0.5

1

1.5

0 100 200 300 2

0

2

4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.40

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5097E-02/ 19 Constant 0.2041 Mean 0.6714E-02 Sigma 0.1761E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5218E-02/ 19 Constant 0.2022 Mean 0.2385E-03 Sigma 0.1841E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.05

0.1

0.15

0 100 200 300

2012/04/10 15.40

1 0 0.05 0.1 0.15 0.2

0 100 200 300 2

0

0.05

0.1

0.15

0 100 200 300 3 0

0.05

0.1

0 100 200 300 4

0 0.02

0.04

0.06

0.08

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.41

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3591E-02/ 19 Constant 0.1881 Mean 0.4780E-02 Sigma 0.1946E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3107E-02/ 19 Constant 0.1887 Mean 0.5322E-03 Sigma 0.1904E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/04/10 15.41

1 0

0.1

0.2

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.41

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7672E-02/ 19 Constant 0.6277 Mean 0.5497E-02 Sigma 0.1864E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8764E-02/ 19 Constant 0.6274 Mean 0.4708E-03 Sigma 0.1865E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

0.8

0 100 200 300

2012/04/10 15.41

1 0

0.25

0.5

0.75

1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0

0.2

0.4

0.6

0.8

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.42

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2240E-01/ 19 Constant 0.8201 Mean 0.7074E-02 Sigma 0.1708E-01

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2316E-01/ 19 Constant 0.8108 Mean 0.1657E-03 Sigma 0.1804E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0

0.25

0.5

0.75

1

0 100 200 300

2012/04/10 15.42

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/04/10 15.42

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1826E-01/ 19 Constant 0.6701 Mean 0.3979E-02 Sigma 0.2044E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1525E-01/ 19 Constant 0.6771 Mean 0.8628E-03 Sigma 0.1900E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.05

0.1

0.15

0 100 200 300

2012/04/10 15.42

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}