LD_2,Q^2=0.55,ε=0.37,θ_{pq}=0.522,π^+

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.09

6

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7585E-01/ 7 Constant 1.636 Mean 0.4557E-02 Sigma 0.6130E-02

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3894E-01/ 6 Constant 1.623 Mean 0.1378E-03 Sigma 0.6235E-02

MissMass

LD_2,Q^2=0.55,ε=0.37,θ_{pq}=0.522,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2012/03/21 17.09

1 0

0.5

1

1.5

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0

0.1

0.2

0.3

0 100 200 300 4

0

0.05

0.1

0.15

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=0.522,π^+

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.09

6

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2532E-01/ 7 Constant 1.835 Mean 0.3942E-02 Sigma 0.7545E-02

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1455E-01/ 6 Constant 1.826 Mean -0.4657E-03 Sigma 0.7671E-02

MissMass

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=0.522,π^+

0

0.02

0.04

0.06

0 100 200 300

2012/03/21 17.09

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.37,θ_{pq}=2,π^+

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.10

6

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2073E-01/ 7 Constant 1.386 Mean 0.4330E-02 Sigma 0.7079E-02

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1569E-01/ 6 Constant 1.385 Mean 0.1319E-03 Sigma 0.7013E-02

MissMass

LD_2,Q^2=0.55,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0 100 200 300

2012/03/21 17.10

1 0

0.5

1

1.5

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.05

0.1

0.15

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=2,π^+

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.10

6

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2303E-01/ 7 Constant 1.811 Mean 0.3869E-02 Sigma 0.7772E-02

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1111E-01/ 6 Constant 1.814 Mean -0.3492E-03 Sigma 0.7627E-02

MissMass

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=2,π^+

0

0.02

0.04

0 100 200 300

2012/03/21 17.10

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0

0.2

0.4

0 100 200 300 5 0

0.1

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.37,θ_{pq}=4,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.11

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2844E-02/ 7 Constant 0.9787 Mean 0.4135E-02 Sigma 0.9140E-02

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1534E-02/ 6 Constant 0.9794 Mean 0.1934E-03 Sigma 0.8949E-02

MissMass

LD_2,Q^2=0.55,ε=0.37,θ_{pq}=4,π^+

0 0.002

0.004

0.006

0.008

0 100 200 300

2012/03/21 17.11

1 0

0.1

0.2

0.3

0.4

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0

0.5

1

1.5

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=4,π^+

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.11

6

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1077E-01/ 7 Constant 1.514 Mean 0.3902E-02 Sigma 0.9007E-02

0

0.5

1

1.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5575E-02/ 6 Constant 1.518 Mean -0.7824E-04 Sigma 0.8812E-02

MissMass

LD_2,Q^2=0.65,ε=0.37,θ_{pq}=4,π^+

0 0.002

0.004

0.006

0.008

0 100 200 300

2012/03/21 17.11

1 0

0.1

0.2

0.3

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0

0.5

1

1.5

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=-2.77,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.12

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2958 / 7 Constant 8.228 Mean 0.4639E-02 Sigma 0.6056E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1867 / 6 Constant 8.221 Mean 0.1321E-03 Sigma 0.6016E-02

MissMass

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

0 100 200 300

2012/03/21 17.12

1 0

2

4

6

0 100 200 300 2

0

2

4

0 100 200 300 3 0

1

2

0 100 200 300 4

0

0.5

1

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.12

6

0

2

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3635E-01/ 7 Constant 5.322 Mean 0.3640E-02 Sigma 0.8338E-02

0

2

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2651E-01/ 6 Constant 5.304 Mean -0.7603E-03 Sigma 0.8502E-02

MissMass

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=-2.77,π^+

0 0.05 0.1 0.15 0.2

0 100 200 300

2012/03/21 17.12

1 0

1

2

3

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

1

2

3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=0,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.12

6

0

2.5

5

7.5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3712 / 7 Constant 9.240 Mean 0.4601E-02 Sigma 0.5988E-02

0

2.5

5

7.5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1661 / 6 Constant 9.154 Mean 0.4797E-04 Sigma 0.6119E-02

MissMass

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/03/21 17.12

1 0 2 4 6 8

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=0,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.13

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1414 / 7 Constant 8.412 Mean 0.3963E-02 Sigma 0.7613E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3533E-01/ 6 Constant 8.348 Mean -0.6625E-03 Sigma 0.7878E-02

MissMass

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=0,π^+

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/03/21 17.13

1 0 1 2 3 4

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=2,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.13

6

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1393 / 7 Constant 6.944 Mean 0.4323E-02 Sigma 0.7350E-02

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1122 / 6 Constant 6.915 Mean 0.1193E-03 Sigma 0.7403E-02

MissMass

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=2,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/03/21 17.13

1 0 2 4 6 8

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=2,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.14

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1258 / 7 Constant 8.132 Mean 0.3771E-02 Sigma 0.7963E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7727E-01/ 6 Constant 8.133 Mean -0.4468E-03 Sigma 0.7917E-02

MissMass

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=2,π^+

0

0.1

0.2

0 100 200 300

2012/03/21 17.14

1 0

2

4

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=4,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.14

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1412E-01/ 7 Constant 4.109 Mean 0.5235E-02 Sigma 0.8786E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7740E-02/ 6 Constant 4.122 Mean 0.2112E-03 Sigma 0.8511E-02

MissMass

LD_2,Q^2=0.55,ε=0.74,θ_{pq}=4,π^+

0

0.01

0.02

0 100 200 300

2012/03/21 17.14

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

2

4

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0

2

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/21 17.14

6

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2304E-01/ 7 Constant 6.256 Mean 0.4844E-02 Sigma 0.8380E-02

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1121E-01/ 6 Constant 6.212 Mean -0.1225E-03 Sigma 0.8711E-02

MissMass

LD_2,Q^2=0.65,ε=0.74,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/03/21 17.14

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

0 100 200 300 5 0

1

2

3

0 100 200 300

6 ϕ_{πq}