LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.49

-t=0.27-0.3

0

1

2

3

4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9147E-01/ 7 Constant 3.627 Mean 0.4091E-02 Sigma 0.6759E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5040E-01/ 6 Constant 3.610 Mean -0.3016E-03 Sigma 0.6871E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2012/03/13 12.49

1 0

1

2

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0 0.1 0.2

0.3 0.4

0 100 200 300 5 0

0.05

0.1

0.15

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.50

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4377E-01/ 7 Constant 3.066 Mean 0.3865E-02 Sigma 0.7382E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2636E-01/ 6 Constant 3.078 Mean -0.3486E-03 Sigma 0.7240E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0.6

0 100 200 300

2012/03/13 12.50

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.50

6

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1138E-01/ 7 Constant 1.916 Mean 0.3628E-02 Sigma 0.8889E-02

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6462E-02/ 6 Constant 1.916 Mean -0.2893E-03 Sigma 0.8867E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/13 12.50

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0 0.25 0.5 0.75 1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.51

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2864 / 7 Constant 13.94 Mean 0.4246E-02 Sigma 0.6632E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1879 / 6 Constant 13.93 Mean -0.2197E-03 Sigma 0.6608E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

6

0 100 200 300

2012/03/13 12.51

1 0 2 4 6 8

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

1

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

5

10

15

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.51

6

0

5

10

15

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4676 / 7 Constant 18.23 Mean 0.4225E-02 Sigma 0.6582E-02

0

5

10

15

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1732 / 6 Constant 18.08 Mean -0.3560E-03 Sigma 0.6753E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/03/13 12.51

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.25

0.5

0.75

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.52

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2411 / 7 Constant 13.99 Mean 0.3849E-02 Sigma 0.7567E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1623 / 6 Constant 13.97 Mean -0.3528E-03 Sigma 0.7590E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

0 100 200 300

2012/03/13 12.52

1 0

5

10

0 100 200 300 2

0

5

10

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.52

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2085E-01/ 7 Constant 7.885 Mean 0.4755E-02 Sigma 0.8370E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1014E-01/ 6 Constant 7.860 Mean -0.2184E-03 Sigma 0.8526E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 0.01

0.02

0.03

0.04

0 100 200 300

2012/03/13 12.52

1 0 0.5 1 1.5 2

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0 2.5 5 7.5 10

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.53

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1706E-01/ 7 Constant 3.899 Mean 0.4014E-02 Sigma 0.8286E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6898E-02/ 6 Constant 3.906 Mean -0.6036E-04 Sigma 0.8151E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

0 100 200 300

2012/03/13 12.53

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.53

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5457E-02/ 7 Constant 2.723 Mean 0.3604E-02 Sigma 0.1046E-01

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3200E-02/ 6 Constant 2.732 Mean 0.4455E-04 Sigma 0.1014E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/03/13 12.53

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5 1 1.5 2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.54

6

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4790E-01/ 7 Constant 7.048 Mean 0.3709E-02 Sigma 0.9170E-02

0

2

4

6

8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2250E-01/ 6 Constant 7.075 Mean -0.1237E-03 Sigma 0.8848E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2012/03/13 12.54

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.54

6

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4469E-01/ 7 Constant 11.32 Mean 0.3878E-02 Sigma 0.8220E-02

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3649E-01/ 6 Constant 11.33 Mean -0.8666E-04 Sigma 0.8057E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0 1 2 3 4

0 100 200 300

2012/03/13 12.54

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

1

2

3

4

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.54

6

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1993E-01/ 7 Constant 7.016 Mean 0.3426E-02 Sigma 0.1049E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1094E-01/ 6 Constant 7.032 Mean 0.4187E-04 Sigma 0.1012E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/03/13 12.55

1 0

0.5

1

1.5

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

5

10

0 100 200 300 4

0 2 4 6 8

0 100 200 300 5 0

2

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.55

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1999E-02/ 7 Constant 0.9623 Mean 0.3567E-02 Sigma 0.1049E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6752E-03/ 6 Constant 0.9682 Mean -0.2006E-03 Sigma 0.1002E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.1 0.2 0.3 0.4

0 100 200 300

2012/03/13 12.55

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0

0.05

0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.56

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6899E-03/ 7 Constant 0.6597 Mean 0.3080E-02 Sigma 0.1278E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4975E-03/ 6 Constant 0.6678 Mean 0.2402E-03 Sigma 0.1168E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/13 12.56

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.56

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8376E-02/ 7 Constant 2.437 Mean 0.3191E-02 Sigma 0.1067E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3940E-02/ 6 Constant 2.449 Mean -0.1418E-03 Sigma 0.1029E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2012/03/13 12.56

1 0

1

2

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.56

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7934E-02/ 7 Constant 3.975 Mean 0.3534E-02 Sigma 0.1035E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5748E-02/ 6 Constant 3.986 Mean -0.7282E-04 Sigma 0.1012E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/03/13 12.57

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.2

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.57

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2636E-02/ 7 Constant 2.400 Mean 0.3280E-02 Sigma 0.1208E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4113E-02/ 6 Constant 2.407 Mean 0.6413E-04 Sigma 0.1198E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/03/13 12.57

1 0

0.5

1

1.5

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.57

6

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1926E-02/ 16 Constant 0.2240 Mean 0.5658E-02 Sigma 0.1654E-01

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4969E-03/ 13 Constant 0.2271 Mean -0.3196E-03 Sigma 0.1539E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.05

0.1

0.15

0 100 200 300

2012/03/13 12.58

1 0 0.05 0.1 0.15 0.2

0 100 200 300 2

0

0.05

0.1

0.15

0.2

0 100 200 300 3 0

0.05

0.1

0.15

0 100 200 300 4

0 0.025

0.05

0.075 0.1

0 100 200 300 5 0

0.02

0.04

0.06

0.08

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.58

6

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1238E-02/ 16 Constant 0.1986 Mean 0.4155E-02 Sigma 0.1797E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5980E-03/ 13 Constant 0.1997 Mean 0.3457E-04 Sigma 0.1699E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/03/13 12.58

1 0

0.1

0.2

0 100 200 300 2

0 0.1 0.2 0.3 0.4

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.58

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5424E-02/ 16 Constant 0.6271 Mean 0.4479E-02 Sigma 0.1817E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3976E-02/ 13 Constant 0.6322 Mean -0.2377E-03 Sigma 0.1679E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

0 100 200 300

2012/03/13 12.58

1 0

0.25

0.5

0.75

1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0 0.2 0.4 0.6 0.8

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.59

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1220E-01/ 16 Constant 0.9429 Mean 0.5515E-02 Sigma 0.1638E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6285E-02/ 13 Constant 0.9503 Mean 0.2497E-04 Sigma 0.1548E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0

0.25

0.5

0.75

1

0 100 200 300

2012/03/13 12.59

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.2

0.4

0.6

0.8

0 100 200 300 3 0

0.2

0.4

0.6

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/13 12.59

6

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9674E-02/ 16 Constant 0.7347 Mean 0.2884E-02 Sigma 0.1897E-01

0 0.2 0.4 0.6 0.8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4032E-02/ 13 Constant 0.7480 Mean 0.7628E-04 Sigma 0.1623E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.05

0.1

0.15

0 100 200 300

2012/03/13 12.59

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0

0.5

1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}