missmass

’Run 17259’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0

2

4

6

8

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2 4 6 8 10 12 14 16

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17259’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17259’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.05

0.1

0.15

0 100 200 300

ID 101

missmass

’Run 17257’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 5 10 15 20 25 30 35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 10 20 30 40 50 60 70

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17257’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17257’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

missmass

’Run 17258’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17258’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.35 0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17258’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17259’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0 1 2 3 4 5 6 7

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2 4 6 8 10 12 14

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17259’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17259’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

missmass

’Run 17257’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

10

20

30

40

50

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 10 20 30 40 50 60 70

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17257’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17257’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

missmass

’Run 17258’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17258’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.35 0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17258’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

missmass

’Run 17260’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

0 1 2 3 4 5 6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

2

4

6

8

10

12

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17260’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75

W VS. Q2

ID 1000000

phi_pq

’Run 17260’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

missmass

’Run 17261’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 2 4 6 8 10 12 14

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2.5 5 7.5 10 12.5 15 17.5 20

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17261’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17261’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

missmass

’Run 17263’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17263’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

2.075

2.1

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17263’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17264’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 10 20 30 40 50 60 70 80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17264’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17264’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

missmass

’Run 17268’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17268’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17268’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

missmass

’Run 17278’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800 900

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

1600

1800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17278’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17278’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

missmass

’Run 17280’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

10

20

30

40

50

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17280’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17280’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

missmass

’Run 17260’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

0 1 2 3 4 5 6 7 8 9

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2 4 6 8 10 12 14 16

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17260’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75

W VS. Q2

ID 1000000

phi_pq

’Run 17260’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

missmass

’Run 17261’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 2.5 5 7.5 10 12.5 15 17.5 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17261’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17261’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

missmass

’Run 17263’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17263’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

2.075

2.1

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17263’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17264’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17264’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17264’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 17268’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17268’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17268’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

10

20

30

40

0 100 200 300

ID 101

missmass

’Run 17278’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

200

400

600

800

1000

1200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

2250

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17278’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17278’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

missmass

’Run 17280’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 10 20 30 40 50 60 70 80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17280’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17280’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

missmass

’Run 17291’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

0 1 2 3 4 5 6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

2

4

6

8

10

12

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17291’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75

W VS. Q2

ID 1000000

phi_pq

’Run 17291’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq -1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

missmass

’Run 17288’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17288’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17288’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

missmass

’Run 17289’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 25 50 75 100 125 150 175 200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17289’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17289’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

missmass

’Run 17290’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 50 100 150 200 250 300

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17290’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17290’,LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

150

200

0 100 200 300

ID 101

missmass

’Run 17291’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

0 1 2 3 4 5 6 7 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2 4 6 8 10 12 14 16

-4 -2 0 2 4 6 8

ID 1000000

’Run 17291’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75

W VS. Q2

ID 1000000

phi_pq

’Run 17291’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

missmass

’Run 17288’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17288’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17288’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0

10

20

30

40

0 100 200 300

ID 101

phi_pq 0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

missmass

’Run 17289’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

50

100

150

200

250

300

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17289’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17289’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17290’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17290’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17290’,LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

missmass

’Run 17017’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0 10 20 30 40 50 60 70 80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17017’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17017’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

missmass

’Run 17018’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200 225

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17018’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17018’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

missmass

’Run 17019’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 20 40 60 80 100 120 140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200 225

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17019’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17019’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

missmass

’Run 17020’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200 225

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17020’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17020’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

missmass

’Run 17021’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17021’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17021’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 17022’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400 450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17022’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17022’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17017’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0

10

20

30

40

50

60

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17017’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17017’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

missmass

’Run 17018’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160 180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17018’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17018’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

missmass

’Run 17019’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 10 20 30 40 50 60 70 80 90

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160 180

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17019’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17019’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17020’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160 180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17020’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17020’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17021’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 20 40 60 80 100 120 140 160

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17021’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17021’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

missmass

’Run 17022’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17022’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17022’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

missmass

’Run 17016’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0 5 10 15 20 25 30 35 40

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17016’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17016’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0 0.25 0.5 0.75 1

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

missmass

’Run 17013’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800 900

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17013’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17013’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17014’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 20 40 60 80 100 120 140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17014’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17014’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

missmass

’Run 17015’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17015’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17015’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

missmass

’Run 17016’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0

10

20

30

40

50

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17016’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17016’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0

0.2

0.4

0 100 200 300

ID 101

phi_pq 0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

missmass

’Run 17013’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800 900

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17013’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17013’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

missmass

’Run 17014’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160 180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17014’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17014’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

missmass

’Run 17015’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17015’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17015’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17038’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 5 10 15 20 25 30 35 40

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

20

40

60

80

100

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17038’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17038’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0 0.25 0.5 0.75 1

0 100 200 300

ID 101

missmass

’Run 17039’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 1 2 3 4 5 6 7 8 9

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

2

4

6

8

10

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17039’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17039’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

missmass

’Run 17031’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

50

100

150

200

250

300

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17031’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17031’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17032’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 25 50 75 100 125 150 175 200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17032’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17032’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17033’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 5 10 15 20 25 30 35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

10

20

30

40

50

60

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17033’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17033’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

missmass

’Run 17037’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 20 40 60 80 100 120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160 180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17037’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17037’,LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 17038’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 5 10 15 20 25 30 35 40

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

20

40

60

80

100

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17038’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17038’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.05 0.1 0.15 0.2

0 100 200 300

ID 101

phi_pq 0 0.25 0.5 0.75 1

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

missmass

’Run 17039’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 1 2 3 4 5 6 7 8 9

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 2 4 6 8 10 12 14

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17039’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17039’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.05 0.1 0.15 0.2

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

missmass

’Run 17031’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

50

100

150

200

250

300

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17031’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17031’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17032’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17032’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17032’,LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101 missmass

’Run 17033’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17033’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000 phi_pq

’Run 17033’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101 missmass

’Run 17037’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17037’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000 phi_pq

’Run 17037’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=2 o

,π

+

,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101 missmass

’Run 17040’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

0

2.5

5

7.5

10

12.5

15

17.5

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17040’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000 phi_pq

’Run 17040’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

1

2

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

2

0 100 200 300

ID 101 missmass

’Run 17041’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

40

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17041’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000 phi_pq

’Run 17041’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101 missmass

’Run 17042’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

400

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17042’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000 phi_pq

’Run 17042’,LD

2

,Q

2

=0.55,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

100

200

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101 missmass

’Run 17040’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17040’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000 phi_pq

’Run 17040’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

1

2

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101 missmass

’Run 17041’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

40

50

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

80

90

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17041’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000 phi_pq

’Run 17041’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101 missmass

’Run 17042’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17042’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000 phi_pq

’Run 17042’,LD

2

,Q

2

=0.65,ε=0.74,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101