1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.1

0 360

ID 4009

2_2 0 0.1

0 360

ID 4010

2_3 0 0.2

0 360

ID 4011

2_4 0 0.1 0.2

0 360

ID 4012

2_5 0 0.1 0.2

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.1

0 360

ID 4017

3_2 0 0.1

0 360

ID 4018

3_3 0 0.1 0.2

0 360

ID 4019

3_4 0 0.1 0.2

0 360

ID 4020

3_5 0 0.2

0 360

ID 4021

3_6 -1 0 1

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.1

0 360

ID 4025

4_2 0 0.1

0 360

ID 4026

4_3 0 0.1 0.2

0 360

ID 4027

4_4 0 0.2 0.4

0 360

ID 4028

4_5 0 0.1

0 360

ID 4029

4_6 -1 0 1

0 360

ID 4030

4_7 -1 0 1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1 0.2

0 360

ID 4033

5_2 0 0.1

0 360

ID 4034

5_3

-0.02

-0.01 0

0 360

ID 4035

5_4 0 0.1 0.2

0 360

ID 4036

5_5 0 0.1

0 360

ID 4037

5_6 -1 0 1

0 360

ID 4038

5_7 -1 0 1

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 0 0.1

0 360

ID 4043

6_4

-0.02

-0.01 0

0 360

ID 4044

6_5 0 0.1

0 360

ID 4045

6_6 -1 0 1

0 360

ID 4046

6_7 -1 0 1

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 20 40

0 360

ID 4001

1_2 0 50 100

0 360

ID 4002

1_3 0 50 100

0 360

ID 4003

1_4 0 20 40

0 360

ID 4004

1_5

0 5

0 360

ID 4005

1_6 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 10

0 360

ID 4009

2_2 0 20 40

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 100

0 360

ID 4012

2_5 0 50 100

0 360

ID 4013

2_6 0 5 10

0 360

ID 4014

2_7 0 1 2

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 5

0 360

ID 4017

3_2 0 10 20

0 360

ID 4018

3_3 0 20 40

0 360

ID 4019

3_4 0 50

0 360

ID 4020

3_5 0 50 100

0 360

ID 4021

3_6 0 50

0 360

ID 4022

3_7 0 1 2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 2

0 360

ID 4025

4_2 0 5 10

0 360

ID 4026

4_3 0 10 20

0 360

ID 4027

4_4 0 20 40

0 360

ID 4028

4_5 0 20 40

0 360

ID 4029

4_6 0 20

0 360

ID 4030

4_7 0 2 4

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 2

0 360

ID 4033

5_2 0 5 10

0 360

ID 4034

5_3 0 10 20

0 360

ID 4035

5_4 0 20

0 360

ID 4036

5_5 0 10 20

0 360

ID 4037

5_6 0 5

0 360

ID 4038

5_7

-0.2 0

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 0 1 2

0 360

ID 4041

6_2 0 2

0 360

ID 4042

6_3 0 5

0 360

ID 4043

6_4 0 5

0 360

ID 4044

6_5 0 10

0 360

ID 4045

6_6 0 5

0 360

ID 4046

6_7

-0.2 0

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0 0.1

0 360

ID 4001

1_2 0 0.1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.1

0 360

ID 4009

2_2 0 0.1

0 360

ID 4010

2_3 0 0.1

0 360

ID 4011

2_4 0 0.1

0 360

ID 4012

2_5 -1 0 1

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 0 0.1 0.2

0 360

ID 4018

3_3 0 0.2

0 360

ID 4019

3_4 0 0.1

0 360

ID 4020

3_5

-0.02

-0.01 0

0 360

ID 4021

3_6 -1 0 1

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.1

0 360

ID 4025

4_2 0 0.2

0 360

ID 4026

4_3 0 0.1 0.2

0 360

ID 4027

4_4 0 0.2

0 360

ID 4028

4_5 0 0.1

0 360

ID 4029

4_6 -1 0 1

0 360

ID 4030

4_7 -1 0 1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1 0.2

0 360

ID 4033

5_2 0 0.1

0 360

ID 4034

5_3

-0.02

-0.01 0

0 360

ID 4035

5_4 0 0.1

0 360

ID 4036

5_5 -1 0 1

0 360

ID 4037

5_6 0 0.1

0 360

ID 4038

5_7 -1 0 1

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 0.1 0.2

0 360

ID 4042

6_3 0 0.1 0.2

0 360

ID 4043

6_4 0 0.1 0.2

0 360

ID 4044

6_5 -1 0 1

0 360

ID 4045

6_6 -1 0 1

0 360

ID 4046

6_7 -1 0 1

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 5 10

0 360

ID 4001

1_2 0 10

0 360

ID 4002

1_3

0 5

0 360

ID 4003

1_4

0 5

0 360

ID 4004

1_5

0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 20

0 360

ID 4009

2_2 0 50

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 25 50

0 360

ID 4012

2_5 0 5 10

0 360

ID 4013

2_6 -1 -0.5 0

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 20

0 360

ID 4017

3_2 0 25 50

0 360

ID 4018

3_3 0 50 100

0 360

ID 4019

3_4 0 100

0 360

ID 4020

3_5 0 50

0 360

ID 4021

3_6 0 2

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 5 10

0 360

ID 4025

4_2 0 20

0 360

ID 4026

4_3 0 25 50

0 360

ID 4027

4_4 0 50

0 360

ID 4028

4_5 0 50

0 360

ID 4029

4_6 0 2.5 5

0 360

ID 4030

4_7 -1 0 1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 5 10

0 360

ID 4033

5_2 0 10 20

0 360

ID 4034

5_3 0 20

0 360

ID 4035

5_4 0 20 40

0 360

ID 4036

5_5 0 20 40

0 360

ID 4037

5_6 0 10

0 360

ID 4038

5_7 0 1 2

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 0 2.5 5

0 360

ID 4041

6_2 0 10

0 360

ID 4042

6_3 0 10 0 360

ID 4043

6_4 0 20

0 360

ID 4044

6_5 0 5 10

0 360

ID 4045

6_6 0 5 10

0 360

ID 4046

6_7 -1 0 1

0 360

ID 4047

6_8 0 1 2

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 0 0.1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 -1 0 1

0 360

ID 4010

2_3 0 0.1 0.2

0 360

ID 4011

2_4 0 0.1 0.2

0 360

ID 4012

2_5 0 0.1

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 0 0.1

0 360

ID 4019

3_4 0 0.1 0.2

0 360

ID 4020

3_5 0 0.1 0.2

0 360

ID 4021

3_6 0 0.1 0.2

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 0 0.1 0.2

0 360

ID 4027

4_4 0 0.1

0 360

ID 4028

4_5 0 0.2

0 360

ID 4029

4_6 0 0.1 0.2

0 360

ID 4030

4_7 0 0.1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 0 0.1 0.2

0 360

ID 4035

5_4 0 0.1

0 360

ID 4036

5_5 0 0.1 0.2

0 360

ID 4037

5_6 0 0.1

0 360

ID 4038

5_7 -1 0 1

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3

-0.02 0

0 360

ID 4043

6_4 0 0.1

0 360

ID 4044

6_5

-0.02

-0.01 0

0 360

ID 4045

6_6 0 0.1 0.2

0 360

ID 4046

6_7 0 0.1

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 5 10

0 360

ID 4001

1_2 0 25 50

0 360

ID 4002

1_3 0 100

0 360

ID 4003

1_4 0 50 100

0 360

ID 4004

1_5 0 10 20

0 360

ID 4005

1_6 -2.5 0 2.5

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 5 10

0 360

ID 4009

2_2 0 50

0 360

ID 4010

2_3 0 100 200

0 360

ID 4011

2_4 0 250 500

0 360

ID 4012

2_5 0 200 400

0 360

ID 4013

2_6 0 25 50

0 360

ID 4014

2_7 -1.8519

-0.7017

0.4485

1.5987

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 2 4

0 360

ID 4017

3_2 0 10 20

0 360

ID 4018

3_3 0 50 100

0 360

ID 4019

3_4 0 100 200

0 360

ID 4020

3_5 0 200 400

0 360

ID 4021

3_6 0 200 400

0 360

ID 4022

3_7 0 50

0 360

ID 4023

3_8 -1.1111

-0.1034

0.9043

1.912

0 360

ID 4024

4_1 0 2

0 360

ID 4025

4_2 0 5 10

0 360

ID 4026

4_3 0 20 40

0 360

ID 4027

4_4 0 50

0 360

ID 4028

4_5 0 100 200

0 360

ID 4029

4_6 0 100 200

0 360

ID 4030

4_7 0 100 200

0 360

ID 4031

4_8 0 10

0 360

ID 4032

5_1

0 2

0 360

ID 4033

5_2 0 10

0 360

ID 4034

5_3 0 10 20

0 360

ID 4035

5_4 0 25 50

0 360

ID 4036

5_5 0 50 0 360

ID 4037

5_6 0 50 100

0 360

ID 4038

5_7 0 50

0 360

ID 4039

5_8 0 10

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 2

0 360

ID 4042

6_3 0 5 10

0 360

ID 4043

6_4 0 10 20

0 360

ID 4044

6_5 0 20 40

0 360

ID 4045

6_6 0 50

0 360

ID 4046

6_7 0 20 40

0 360

ID 4047

6_8 0 5

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4

-0.02

-0.01 0

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.1

0 360

ID 4009

2_2 0 0.1

0 360

ID 4010

2_3 0 0.1

0 360

ID 4011

2_4 0 0.1

0 360

ID 4012

2_5 -1 0 1

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.1 0.2

0 360

ID 4017

3_2 0 0.1

0 360

ID 4018

3_3 0 0.1 0.2

0 360

ID 4019

3_4 0 0.1 0.2

0 360

ID 4020

3_5 0 0.1 0.2

0 360

ID 4021

3_6

-0.02

-0.01 0

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.1

0 360

ID 4025

4_2

-0.02

-0.01 0

0 360

ID 4026

4_3 0 0.1

0 360

ID 4027

4_4 0 0.1

0 360

ID 4028

4_5 0 0.1 0.2

0 360

ID 4029

4_6 -1 0 1

0 360

ID 4030

4_7 -1 0 1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1

0 360

ID 4033

5_2 0 0.1 0.2

0 360

ID 4034

5_3 0 0.1

0 360

ID 4035

5_4 0 0.1 0.2

0 360

ID 4036

5_5 0 0.1 0.2

0 360

ID 4037

5_6 0 0.1

0 360

ID 4038

5_7 -1 0 1

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 0 0.1

0 360

ID 4041

6_2 0 0.1 0.2

0 360

ID 4042

6_3 0 0.1

0 360

ID 4043

6_4

-0.02

-0.01 0

0 360

ID 4044

6_5 0 0.1

0 360

ID 4045

6_6 0 0.1

0 360

ID 4046

6_7 -1 0 1

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 5

0 360

ID 4001

1_2 0 10

0 360

ID 4002

1_3

0 10

0 360

ID 4003

1_4 -5.9259

-0.8932

4.1395

9.1722

0 360

ID 4004

1_5 0 5

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 25 50

0 360

ID 4009

2_2 0 100 200

0 360

ID 4010

2_3 0 200

0 360

ID 4011

2_4 0 100

0 360

ID 4012

2_5 0 20 40

0 360

ID 4013

2_6 0 2.5 5

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 25 50

0 360

ID 4017

3_2 0 100 0 360

ID 4018

3_3 0 200

0 360

ID 4019

3_4 0 200 400

0 360

ID 4020

3_5 0 200 400

0 360

ID 4021

3_6 0 20 40

0 360

ID 4022

3_7 0 1 2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 10 20

0 360

ID 4025

4_2 0 50 100

0 360

ID 4026

4_3 0 100

0 360

ID 4027

4_4 0 100 200

0 360

ID 4028

4_5 0 200

0 360

ID 4029

4_6 0 100 200

0 360

ID 4030

4_7 0 10 20

0 360

ID 4031

4_8 0 1 2

0 360

ID 4032

5_1 0 10 0 360

ID 4033

5_2 0 20 40

0 360

ID 4034

5_3 0 50 100

0 360

ID 4035

5_4 0 50 100

0 360

ID 4036

5_5 0 100

0 360

ID 4037

5_6 0 50 100

0 360

ID 4038

5_7 0 10 0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 0 10 0 360

ID 4041

6_2 0 10 20

0 360

ID 4042

6_3 0 20 40

0 360

ID 4043

6_4 0 50

0 360

ID 4044

6_5 0 50 0 360

ID 4045

6_6 0 20 40

0 360

ID 4046

6_7 0 5 10

0 360

ID 4047

6_8 0 1 2

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 -1 0 1

0 360

ID 4010

2_3 -1 0 1

0 360

ID 4011

2_4 -1 0 1

0 360

ID 4012

2_5 -1 0 1

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 -1 0 1

0 360

ID 4019

3_4 0 0.1

0 360

ID 4020

3_5 0 0.1

0 360

ID 4021

3_6 0 0.2 0 360

ID 4022

3_7 0 0.1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 -1 0 1

0 360

ID 4027

4_4 -1 0 1

0 360

ID 4028

4_5 0 0.1 0.2

0 360

ID 4029

4_6 0 0.2

0 360

ID 4030

4_7 0 0.1

0 360

ID 4031

4_8 0 0.1 0.2

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 -1 0 1

0 360

ID 4035

5_4 -1 0 1

0 360

ID 4036

5_5 0 0.1 0.2

0 360

ID 4037

5_6 0 0.1

0 360

ID 4038

5_7 0 0.2 0.4

0 360

ID 4039

5_8 0 0.1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 -1 0 1

0 360

ID 4044

6_5 0 0.1

0 360

ID 4045

6_6 0 0.1

0 360

ID 4046

6_7 0 0.2 0.4

0 360

ID 4047

6_8 0 0.1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

-1 0 1

0 360

ID 4001

1_2 0 1 2

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4

-2 0

0 360

ID 4004

1_5 0 2 4

0 360

ID 4005

1_6 0 2 4

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 0 1 2

0 360

ID 4010

2_3 0 5

0 360

ID 4011

2_4 0 25 50

0 360

ID 4012

2_5 0 50

0 360

ID 4013

2_6 0 10

0 360

ID 4014

2_7 0 2.5 5

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 0 1 2

0 360

ID 4019

3_4 0 20 40

0 360

ID 4020

3_5 0 100 200

0 360

ID 4021

3_6 0 200

0 360

ID 4022

3_7 0 50

0 360

ID 4023

3_8 -2 0

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 0 1 2

0 360

ID 4027

4_4 0 10 20

0 360

ID 4028

4_5 0 25 50

0 360

ID 4029

4_6 0 100 200

0 360

ID 4030

4_7 0 200 400

0 360

ID 4031

4_8 0

50

0 360

ID 4032

5_1

-0.2 0

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 0 1 2

0 360

ID 4035

5_4 0 5 10

0 360

ID 4036

5_5 0 20

0 360

ID 4037

5_6 0 50

0 360

ID 4038

5_7 0 100 200

0 360

ID 4039

5_8 0 200

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 0 5 10

0 360

ID 4044

6_5 0 10 20

0 360

ID 4045

6_6 0 25 50

0 360

ID 4046

6_7 0 50 100

0 360

ID 4047

6_8 0 100 200

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3

-0.02

-0.01 0

0 360

ID 4003

1_4

-0.02 0

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 0 0.1

0 360

ID 4010

2_3 -1 0 1

0 360

ID 4011

2_4 -1 0 1

0 360

ID 4012

2_5 -1 0 1

0 360

ID 4013

2_6 0 0.1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 0 0.1 0.2

0 360

ID 4019

3_4 0 0.1 0.2

0 360

ID 4020

3_5 0 0.1 0.2

0 360

ID 4021

3_6 0 0.1

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 0 0.1

0 360

ID 4027

4_4 0 0.1 0.2

0 360

ID 4028

4_5 0 0.1 0.2

0 360

ID 4029

4_6 0 0.1 0.2

0 360

ID 4030

4_7 0 0.1

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 0 0.1 0.2

0 360

ID 4035

5_4 0 0.1

0 360

ID 4036

5_5 0 0.1 0.2

0 360

ID 4037

5_6 0 0.1 0.2

0 360

ID 4038

5_7 0 0.1 0.2

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 0 0.1 0.2

0 360

ID 4044

6_5 0 0.2

0 360

ID 4045

6_6 0 0.1

0 360

ID 4046

6_7 0 0.1 0.2

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

-0.2 0

0 360

ID 4001

1_2 0 2

0 360

ID 4002

1_3

0 2 4

0 360

ID 4003

1_4

0 2 4

0 360

ID 4004

1_5

0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 0 5 10

0 360

ID 4010

2_3 0 20 40

0 360

ID 4011

2_4 0 50

0 360

ID 4012

2_5 0 10

0 360

ID 4013

2_6

0 5

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 1 2

0 360

ID 4017

3_2 0 20

0 360

ID 4018

3_3 0 50 100

0 360

ID 4019

3_4 0 100 200

0 360

ID 4020

3_5 0 200

0 360

ID 4021

3_6 0 50

0 360

ID 4022

3_7

0 5

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 1 2

0 360

ID 4025

4_2 0 10 20

0 360

ID 4026

4_3 0 50

0 360

ID 4027

4_4 0 100

0 360

ID 4028

4_5 0 200

0 360

ID 4029

4_6 0 200 400

0 360

ID 4030

4_7 0 50 100

0 360

ID 4031

4_8 -2 0

0 360

ID 4032

5_1 0 1 2

0 360

ID 4033

5_2 0 5 10

0 360

ID 4034

5_3 0 20 40

0 360

ID 4035

5_4 0 50

0 360

ID 4036

5_5 0 100

0 360

ID 4037

5_6 0 100 200

0 360

ID 4038

5_7 0 100 200

0 360

ID 4039

5_8 0 25 50

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 2 4

0 360

ID 4042

6_3 0 10

0 360

ID 4043

6_4 0 20 40

0 360

ID 4044

6_5 0 50 100

0 360

ID 4045

6_6 0 50 100

0 360

ID 4046

6_7 0 50 100

0 360

ID 4047

6_8 0 50 100

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0 0.2 0.4

0 360

ID 4001

1_2 0 0.5 1

0 360

ID 4002

1_3 0 0.5 1

0 360

ID 4003

1_4 0 0.2 0.4

0 360

ID 4004

1_5 -0.1 0 0.1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.5

0 360

ID 4009

2_2 0 1

0 360

ID 4010

2_3 0 1 2

0 360

ID 4011

2_4 0 1 2

0 360

ID 4012

2_5 0 0.5 1

0 360

ID 4013

2_6 -0.3222

-0.0558

0.2106

0.4771

0 360

ID 4014

2_7

-0.02 0

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.2

0 360

ID 4017

3_2 0 0.5 1

0 360

ID 4018

3_3 0 1 2

0 360

ID 4019

3_4 0 1 2

0 360

ID 4020

3_5 0 0.5 1

0 360

ID 4021

3_6 0 0.5

0 360

ID 4022

3_7 0 0.1 0.2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.1 0.2

0 360

ID 4025

4_2 0 0.25 0.5

0 360

ID 4026

4_3 0 0.5 1

0 360

ID 4027

4_4 0 1 0 360

ID 4028

4_5 0 1 2

0 360

ID 4029

4_6 0 0.5 1

0 360

ID 4030

4_7 0 0.2 0.4

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1

0 360

ID 4033

5_2 0 0.25 0.5

0 360

ID 4034

5_3 0 0.5

0 360

ID 4035

5_4 0 0.5 1

0 360

ID 4036

5_5 0 0.5 1

0 360

ID 4037

5_6 0 0.5 1

0 360

ID 4038

5_7 0 0.25 0.5

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 0.1

0 360

ID 4042

6_3 0 0.1 0.2

0 360

ID 4043

6_4 0 0.2 0.4

0 360

ID 4044

6_5 0 0.25 0.5

0 360

ID 4045

6_6 0 0.5 1

0 360

ID 4046

6_7 0 0.25 0.5

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 20 40

0 360

ID 4001

1_2 0 100

0 360

ID 4002

1_3 0 100 200

0 360

ID 4003

1_4 0 50 100

0 360

ID 4004

1_5

0 5 10

0 360

ID 4005

1_6 -1.4815

-0.3503

0.7808

1.912

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 10 20

0 360

ID 4009

2_2 0 50

0 360

ID 4010

2_3 0 100

0 360

ID 4011

2_4 0 100 200

0 360

ID 4012

2_5 0 100

0 360

ID 4013

2_6 0 10

0 360

ID 4014

2_7 0 2

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 5 10

0 360

ID 4017

3_2 0 20

0 360

ID 4018

3_3 0 20 40

0 360

ID 4019

3_4 0 50 100

0 360

ID 4020

3_5 0 100

0 360

ID 4021

3_6 0 50 100

0 360

ID 4022

3_7 0 5 10

0 360

ID 4023

3_8 0 1 2

0 360

ID 4024

4_1 0 5

0 360

ID 4025

4_2 0 10

0 360

ID 4026

4_3 0 20

0 360

ID 4027

4_4 0 20 40

0 360

ID 4028

4_5 0 25 50

0 360

ID 4029

4_6 0 50

0 360

ID 4030

4_7 0 20 40

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1

0 1 2

0 360

ID 4033

5_2 0 5

0 360

ID 4034

5_3 0 5 10

0 360

ID 4035

5_4 0 10 20

0 360

ID 4036

5_5 0 20 0 360

ID 4037

5_6 0 20 40

0 360

ID 4038

5_7 0 10 20

0 360

ID 4039

5_8 0 5

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 0 2 4

0 360

ID 4043

6_4 0 5 10

0 360

ID 4044

6_5 0 10

0 360

ID 4045

6_6 0 10 20

0 360

ID 4046

6_7 0 10

0 360

ID 4047

6_8 0 2 4

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0 0.1

0 360

ID 4001

1_2 0 0.1 0.2

0 360

ID 4002

1_3

0 0.1

0 360

ID 4003

1_4 0 0.2

0 360

ID 4004

1_5 0 0.2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 0 0.25 0.5

0 360

ID 4010

2_3 0

0.5

0 360

ID 4011

2_4 0 0.5 1

0 360

ID 4012

2_5

0 0.2 0.4

0 360

ID 4013

2_6

0 0.25 0.5

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.1

0 360

ID 4017

3_2 0 0.1 0.2

0 360

ID 4018

3_3 0 0.5 1

0 360

ID 4019

3_4 0 1

0 360

ID 4020

3_5 0 1

0 360

ID 4021

3_6 0 0.5

0 360

ID 4022

3_7 0 0.2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 0 0.2

0 360

ID 4026

4_3 0 0.5 1

0 360

ID 4027

4_4 0 1 2

0 360

ID 4028

4_5 0 1 2

0 360

ID 4029

4_6 0 1 2

0 360

ID 4030

4_7 0 0.5

0 360

ID 4031

4_8 0 0.1 0.2

0 360

ID 4032

5_1 0 0.1

0 360

ID 4033

5_2 0 0.1 0.2

0 360

ID 4034

5_3 0 0.25 0.5

0 360

ID 4035

5_4 0 0.5 1

0 360

ID 4036

5_5 0 1 0 360

ID 4037

5_6 0 1

0 360

ID 4038

5_7 0 0.5 1

0 360

ID 4039

5_8 0 0.25 0.5

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 0.1 0.2

0 360

ID 4042

6_3 0 0.2 0.4

0 360

ID 4043

6_4 0 0.5 1

0 360

ID 4044

6_5 0 1

0 360

ID 4045

6_6 0 1 2

0 360

ID 4046

6_7 0 1

0 360

ID 4047

6_8 0 0.25 0.5

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 2

0 360

ID 4001

1_2 0 10 20

0 360

ID 4002

1_3 0 5 10

0 360

ID 4003

1_4

0 5

0 360

ID 4004

1_5

-2 0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 5

0 360

ID 4009

2_2 0 20 40

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 50 100

0 360

ID 4012

2_5 0 20

0 360

ID 4013

2_6

0 2.5 5

0 360

ID 4014

2_7 0 1 2

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 1 2

0 360

ID 4017

3_2 0 5

0 360

ID 4018

3_3 0 20 40

0 360

ID 4019

3_4 0 100 200

0 360

ID 4020

3_5 0 100 200

0 360

ID 4021

3_6 0 25 50

0 360

ID 4022

3_7 -2.5 0 2.5

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 1 2

0 360

ID 4025

4_2 0 5

0 360

ID 4026

4_3 0 10 20

0 360

ID 4027

4_4 0 50

0 360

ID 4028

4_5 0 100 200

0 360

ID 4029

4_6 0 100 200

0 360

ID 4030

4_7 0 20

0 360

ID 4031

4_8

0 2

0 360

ID 4032

5_1 0 1 2

0 360

ID 4033

5_2 0 5

0 360

ID 4034

5_3 0 5 10

0 360

ID 4035

5_4 0 20 40

0 360

ID 4036

5_5 0 50 100

0 360

ID 4037

5_6 0 100

0 360

ID 4038

5_7 0 50 100

0 360

ID 4039

5_8 0 10 0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 1

0 360

ID 4042

6_3 0 5 10

0 360

ID 4043

6_4 0 20

0 360

ID 4044

6_5 0 20 40

0 360

ID 4045

6_6 0 50

0 360

ID 4046

6_7 0 50 100

0 360

ID 4047

6_8 0 20 40

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0 0.1 0.2

0 360

ID 4001

1_2 0 0.5

0 360

ID 4002

1_3 0 0.25 0.5

0 360

ID 4003

1_4

0 0.2

0 360

ID 4004

1_5 0 0.1 0.2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.2 0.4

0 360

ID 4009

2_2 0 0.5 1

0 360

ID 4010

2_3 0 0.5 1

0 360

ID 4011

2_4 0 0.5 1

0 360

ID 4012

2_5 0 0.5

0 360

ID 4013

2_6 0 0.1 0.2

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.2

0 360

ID 4017

3_2 0 0.25 0.5

0 360

ID 4018

3_3 0 0.5 1

0 360

ID 4019

3_4 0 0.5 1

0 360

ID 4020

3_5 0 0.5

0 360

ID 4021

3_6 0 0.2 0.4

0 360

ID 4022

3_7 0 0.2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.2 0.4

0 360

ID 4025

4_2 0 0.2 0.4

0 360

ID 4026

4_3 0 0.5

0 360

ID 4027

4_4 0 0.5 1

0 360

ID 4028

4_5 0 0.25 0.5

0 360

ID 4029

4_6 0 0.5

0 360

ID 4030

4_7 0 0.1 0.2

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1 0.2

0 360

ID 4033

5_2 0 0.2 0.4

0 360

ID 4034

5_3 0 0.5 0 360

ID 4035

5_4 0 0.25 0.5

0 360

ID 4036

5_5 0 0.25 0.5

0 360

ID 4037

5_6 0 0.25 0.5

0 360

ID 4038

5_7 0 0.1 0.2

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 0.1 0.2

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 -1 0 1

0 360

ID 4044

6_5 0 0.2 0.4

0 360

ID 4045

6_6 0 0.2 0.4

0 360

ID 4046

6_7 0 0.1 0.2

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 25 50

0 360

ID 4001

1_2 0 100

0 360

ID 4002

1_3 0 100

0 360

ID 4003

1_4 0 50 0 360

ID 4004

1_5 0 10

0 360

ID 4005

1_6 0 1 2

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 10 20

0 360

ID 4009

2_2 0 25 50

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 100 200

0 360

ID 4012

2_5 0 100

0 360

ID 4013

2_6 0 20

0 360

ID 4014

2_7

-0.5

-0.25 0

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 5 10

0 360

ID 4017

3_2 0 10 20

0 360

ID 4018

3_3 0 20 40

0 360

ID 4019

3_4 0 50

0 360

ID 4020

3_5 0 50 100

0 360

ID 4021

3_6 0 50

0 360

ID 4022

3_7 0 10

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 2.5 5

0 360

ID 4025

4_2 0 10 20

0 360

ID 4026

4_3 0 20 0 360

ID 4027

4_4 0 20

0 360

ID 4028

4_5 0 20

0 360

ID 4029

4_6 0 20 40

0 360

ID 4030

4_7 0 10 20

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 2.5 5

0 360

ID 4033

5_2 0 5 10

0 360

ID 4034

5_3 0 10 20

0 360

ID 4035

5_4 0 10 20

0 360

ID 4036

5_5 0 10 20

0 360

ID 4037

5_6 0 10 20

0 360

ID 4038

5_7 0 5 10

0 360

ID 4039

5_8 0 1 2

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 1 2

0 360

ID 4042

6_3 0 2 4

0 360

ID 4043

6_4 0 5 10

0 360

ID 4044

6_5 0 5 10

0 360

ID 4045

6_6 0 5 10

0 360

ID 4046

6_7 0 2.5 5

0 360

ID 4047

6_8 0 2 4

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0 0.2

0 360

ID 4001

1_2 0 0.1 0.2

0 360

ID 4002

1_3

0 0.2

0 360

ID 4003

1_4

0 0.1 0.2

0 360

ID 4004

1_5 -1 0 1

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.2 0.4

0 360

ID 4009

2_2 0 0.5

0 360

ID 4010

2_3 0 0.2 0.4

0 360

ID 4011

2_4 0 0.2

0 360

ID 4012

2_5 0 0.1

0 360

ID 4013

2_6 -1 0 1

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.2 0.4

0 360

ID 4017

3_2 0 0.5 1

0 360

ID 4018

3_3 0 1

0 360

ID 4019

3_4 0 0.5

0 360

ID 4020

3_5 0 0.2 0 360

ID 4021

3_6

0 0.1

0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.2 0 360

ID 4025

4_2 0 0.25 0.5

0 360

ID 4026

4_3 0 0.5 1

0 360

ID 4027

4_4 0 0.5

0 360

ID 4028

4_5 0 0.5 1

0 360

ID 4029

4_6 0 0.2 0.4

0 360

ID 4030

4_7

-0.05 0

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.2 0.4

0 360

ID 4033

5_2 0 0.5

0 360

ID 4034

5_3 0 0.25 0.5

0 360

ID 4035

5_4 0 0.25 0.5

0 360

ID 4036

5_5 0 0.25 0.5

0 360

ID 4037

5_6 0 0.2 0.4

0 360

ID 4038

5_7 0 0.2 0.4

0 360

ID 4039

5_8 -1 0 1

0 360

ID 4040

6_1 0 0.1

0 360

ID 4041

6_2 0 0.2 0.4

0 360

ID 4042

6_3 0 0.2 0.4

0 360

ID 4043

6_4 0 0.5

0 360

ID 4044

6_5 0 0.5

0 360

ID 4045

6_6 0 0.2

0 360

ID 4046

6_7 0 0.1 0.2

0 360

ID 4047

6_8 -1 0 1

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 10 20

0 360

ID 4001

1_2 0 20 40

0 360

ID 4002

1_3 0 10

0 360

ID 4003

1_4

0 5

0 360

ID 4004

1_5 -2 0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 20 40

0 360

ID 4009

2_2 0 50 100

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 50

0 360

ID 4012

2_5

0 10

0 360

ID 4013

2_6 0 2 4

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 10 20

0 360

ID 4017

3_2 0 50

0 360

ID 4018

3_3 0 50 100

0 360

ID 4019

3_4 0 100

0 360

ID 4020

3_5 0 50 100

0 360

ID 4021

3_6 0 10 20

0 360

ID 4022

3_7 0 1 2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 5 10

0 360

ID 4025

4_2 0 20 40

0 360

ID 4026

4_3 0 25 50

0 360

ID 4027

4_4 0 25 50

0 360

ID 4028

4_5 0 50

0 360

ID 4029

4_6 0 50

0 360

ID 4030

4_7 0 5

0 360

ID 4031

4_8 0 1 2

0 360

ID 4032

5_1 0 5 10

0 360

ID 4033

5_2 0 10 20

0 360

ID 4034

5_3 0 20

0 360

ID 4035

5_4 0 20

0 360

ID 4036

5_5 0 20 40

0 360

ID 4037

5_6 0 20 40

0 360

ID 4038

5_7 0 10

0 360

ID 4039

5_8 0 1 2

0 360

ID 4040

6_1 0 2.5 5

0 360

ID 4041

6_2 0 10

0 360

ID 4042

6_3 0 10 20

0 360

ID 4043

6_4 0 10 20

0 360

ID 4044

6_5 0 20

0 360

ID 4045

6_6 0 10 20

0 360

ID 4046

6_7 0 10

0 360

ID 4047

6_8 0 2

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2

-0.02

-0.01 0

0 360

ID 4002

1_3 0 0.2 0.4

0 360

ID 4003

1_4

0 0.1

0 360

ID 4004

1_5

-0.05 0

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 0 0.1

0 360

ID 4010

2_3 0 0.25 0.5

0 360

ID 4011

2_4 0 1

0 360

ID 4012

2_5 0 0.5

0 360

ID 4013

2_6 0 0.2 0 360

ID 4014

2_7 0 0.1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 0 0.1 0.2

0 360

ID 4018

3_3 0 0.5

0 360

ID 4019

3_4 0 1

0 360

ID 4020

3_5 0 1

0 360

ID 4021

3_6 0 0.5 1

0 360

ID 4022

3_7 0 0.25 0.5

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 0 0.1

0 360

ID 4026

4_3 0 0.5

0 360

ID 4027

4_4 0 0.5

0 360

ID 4028

4_5 0 0.5 1

0 360

ID 4029

4_6 0 0.5 1

0 360

ID 4030

4_7 0 0.25 0.5

0 360

ID 4031

4_8 0 0.2

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 0 0.1 0.2

0 360

ID 4034

5_3 0 0.2

0 360

ID 4035

5_4 0 0.5

0 360

ID 4036

5_5 0 0.5 0 360

ID 4037

5_6 0 0.5

0 360

ID 4038

5_7 0 0.5

0 360

ID 4039

5_8 0 0.2 0.4

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 0 0.2 0.4

0 360

ID 4044

6_5 0 0.2

0 360

ID 4045

6_6 0 0.25 0.5

0 360

ID 4046

6_7 0 0.25 0.5

0 360

ID 4047

6_8 0 0.2

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 2 4

0 360

ID 4001

1_2 0 10 20

0 360

ID 4002

1_3 0 25 50

0 360

ID 4003

1_4 0 20 40

0 360

ID 4004

1_5 0 5 10

0 360

ID 4005

1_6 0 2

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 1 2

0 360

ID 4009

2_2 0 10

0 360

ID 4010

2_3 0 50

0 360

ID 4011

2_4 0 100 200

0 360

ID 4012

2_5 0 100

0 360

ID 4013

2_6 0 20 40

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 2 4

0 360

ID 4017

3_2 0 5

0 360

ID 4018

3_3 0 10 20

0 360

ID 4019

3_4 0 50

0 360

ID 4020

3_5 0 100

0 360

ID 4021

3_6 0 100 200

0 360

ID 4022

3_7 0 20 40

0 360

ID 4023

3_8

-0.2 0

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 0 2 4

0 360

ID 4026

4_3 0 10 20

0 360

ID 4027

4_4 0 10 20

0 360

ID 4028

4_5 0 20 40

0 360

ID 4029

4_6 0 50 100

0 360

ID 4030

4_7 0 50 100

0 360

ID 4031

4_8 0 20

0 360

ID 4032

5_1 0 2

0 360

ID 4033

5_2 0 2

0 360

ID 4034

5_3 0 5 10

0 360

ID 4035

5_4 0 10 20

0 360

ID 4036

5_5 0 10 20

0 360

ID 4037

5_6 0 20 40

0 360

ID 4038

5_7 0 20 40

0 360

ID 4039

5_8 0 20

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 0 1 2

0 360

ID 4043

6_4 0 5 10

0 360

ID 4044

6_5 0 10

0 360

ID 4045

6_6 0 10 20

0 360

ID 4046

6_7 0 10

0 360

ID 4047

6_8 0 5 10

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.1 0.2

0 360

ID 4001

1_2 0 0.1

0 360

ID 4002

1_3

0 0.1 0.2

0 360

ID 4003

1_4

0 0.1

0 360

ID 4004

1_5

-0.02

-0.01 0

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 0.2 0.4

0 360

ID 4009

2_2 0 0.2 0.4

0 360

ID 4010

2_3 0 0.25 0.5

0 360

ID 4011

2_4 0 0.2

0 360

ID 4012

2_5 0 0.2

0 360

ID 4013

2_6

-0.02 0

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 0.2

0 360

ID 4017

3_2 0 0.25 0.5

0 360

ID 4018

3_3 0 0.5

0 360

ID 4019

3_4 0 0.5 1

0 360

ID 4020

3_5 0 0.2 0.4

0 360

ID 4021

3_6 0 0.2

0 360

ID 4022

3_7

-0.02 0

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 0.1 0.2

0 360

ID 4025

4_2 0 0.25 0.5

0 360

ID 4026

4_3 0 0.5 1

0 360

ID 4027

4_4 0 0.5

0 360

ID 4028

4_5 0 0.25 0.5

0 360

ID 4029

4_6 0 0.2 0.4

0 360

ID 4030

4_7 0 0.1 0.2

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.2 0.4

0 360

ID 4033

5_2 0 0.2 0.4

0 360

ID 4034

5_3 0 0.5

0 360

ID 4035

5_4 0 0.5

0 360

ID 4036

5_5 0 0.5

0 360

ID 4037

5_6 0 0.25 0.5

0 360

ID 4038

5_7 0 0.2

0 360

ID 4039

5_8 0 0.1 0.2

0 360

ID 4040

6_1 0 0.2 0.4

0 360

ID 4041

6_2 0 0.2 0.4

0 360

ID 4042

6_3 0 0.25 0.5

0 360

ID 4043

6_4 0 0.25 0.5

0 360

ID 4044

6_5 0 0.25 0.5

0 360

ID 4045

6_6 0 0.2 0.4

0 360

ID 4046

6_7 0 0.2 0.4

0 360

ID 4047

6_8 0 0.1 0.2

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 2 4

0 360

ID 4001

1_2 0 5 10

0 360

ID 4002

1_3 0 5 10

0 360

ID 4003

1_4 0 2.5 5

0 360

ID 4004

1_5

0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 10 20

0 360

ID 4009

2_2 0 50

0 360

ID 4010

2_3 0 50 100

0 360

ID 4011

2_4 0 25 50

0 360

ID 4012

2_5 0 10 20

0 360

ID 4013

2_6 0 1 2

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 10 20

0 360

ID 4017

3_2 0 25 50

0 360

ID 4018

3_3 0 50 100

0 360

ID 4019

3_4 0 100

0 360

ID 4020

3_5 0 50 100

0 360

ID 4021

3_6 0 20

0 360

ID 4022

3_7 0 2

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 0 10

0 360

ID 4025

4_2 0 20

0 360

ID 4026

4_3 0 20 40

0 360

ID 4027

4_4 0 20 40

0 360

ID 4028

4_5 0 50

0 360

ID 4029

4_6 0 25 50

0 360

ID 4030

4_7 0 10 20

0 360

ID 4031

4_8 0 1 2

0 360

ID 4032

5_1 0 2.5 5

0 360

ID 4033

5_2 0 5 10

0 360

ID 4034

5_3 0 10 20

0 360

ID 4035

5_4 0 20

0 360

ID 4036

5_5 0 20

0 360

ID 4037

5_6 0 20 40

0 360

ID 4038

5_7 0 20

0 360

ID 4039

5_8 0 2

0 360

ID 4040

6_1 0 2 4

0 360

ID 4041

6_2 0 5

0 360

ID 4042

6_3 0 10

0 360

ID 4043

6_4 0 10 20

0 360

ID 4044

6_5 0 10

0 360

ID 4045

6_6 0 10 20

0 360

ID 4046

6_7 0 10

0 360

ID 4047

6_8 0 5

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5

-0.02 0

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 -1 0 1

0 360

ID 4010

2_3 -1 0 1

0 360

ID 4011

2_4 0 0.1 0.2

0 360

ID 4012

2_5 0 0.1 0.2

0 360

ID 4013

2_6 0 0.1 0.2

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 -1 0 1

0 360

ID 4019

3_4 0 0.1 0.2

0 360

ID 4020

3_5 0 0.2 0.4

0 360

ID 4021

3_6 0 0.5

0 360

ID 4022

3_7 0 0.2 0.4

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 -1 0 1

0 360

ID 4027

4_4 0 0.1 0.2

0 360

ID 4028

4_5 0 0.2 0.4

0 360

ID 4029

4_6 0 0.5 1

0 360

ID 4030

4_7 0 0.5 1

0 360

ID 4031

4_8 0 0.2 0.4

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 -1 0 1

0 360

ID 4035

5_4 -1 0 1

0 360

ID 4036

5_5 0 0.25 0.5

0 360

ID 4037

5_6 0 0.2 0.4

0 360

ID 4038

5_7 0 1

0 360

ID 4039

5_8 0 0.5 1

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 -1 0 1

0 360

ID 4044

6_5 0 0.1 0.2

0 360

ID 4045

6_6

0 0.1

0 360

ID 4046

6_7 0 1

0 360

ID 4047

6_8 0 0.5 1

0 360

ID 4048

1_1

LD_2,Q^2=0.55,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3 -1 0 1

0 360

ID 4003

1_4

0 1 2

0 360

ID 4004

1_5 0 2 4

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 -1 0 1

0 360

ID 4010

2_3 0 1 2

0 360

ID 4011

2_4 0 20

0 360

ID 4012

2_5 0 20

0 360

ID 4013

2_6 0 5 10

0 360

ID 4014

2_7 0 1 2

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 -1 0 1

0 360

ID 4019

3_4 0 5 10

0 360

ID 4020

3_5 0 50 100

0 360

ID 4021

3_6 0 100 200

0 360

ID 4022

3_7 0 25 50

0 360

ID 4023

3_8 -2 0

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 -1 0 1

0 360

ID 4026

4_3 -1 0 1

0 360

ID 4027

4_4 0 5

0 360

ID 4028

4_5 0 10 20

0 360

ID 4029

4_6 0 50 100

0 360

ID 4030

4_7 0 100 200

0 360

ID 4031

4_8 0 25 50

0 360

ID 4032

5_1 -1 0 1

0 360

ID 4033

5_2 -1 0 1

0 360

ID 4034

5_3 0 1 2

0 360

ID 4035

5_4 0 2.5 5

0 360

ID 4036

5_5 0 10

0 360

ID 4037

5_6 0 20 40

0 360

ID 4038

5_7 0 50 100

0 360

ID 4039

5_8 0 100 200

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 -1 0 1

0 360

ID 4042

6_3 -1 0 1

0 360

ID 4043

6_4 0 1 2

0 360

ID 4044

6_5 0 5

0 360

ID 4045

6_6 0 20

0 360

ID 4046

6_7 0 20 40

0 360

ID 4047

6_8 0 50 100

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=0

-1 0 1

0 360

ID 4001

1_2 -1 0 1

0 360

ID 4002

1_3

-0.02 0

0 360

ID 4003

1_4 -1 0 1

0 360

ID 4004

1_5 0 0.1 0.2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 -1 0 1

0 360

ID 4009

2_2 -1 0 1

0 360

ID 4010

2_3 0 0.1 0.2

0 360

ID 4011

2_4 0 0.1 0.2

0 360

ID 4012

2_5 0 0.1

0 360

ID 4013

2_6 0 0.1 0.2

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 -1 0 1

0 360

ID 4017

3_2 -1 0 1

0 360

ID 4018

3_3 0 0.2

0 360

ID 4019

3_4 0 0.25 0.5

0 360

ID 4020

3_5 0 0.25 0.5

0 360

ID 4021

3_6 0 0.2 0 360

ID 4022

3_7 -1 0 1

0 360

ID 4023

3_8 -1 0 1

0 360

ID 4024

4_1 -1 0 1

0 360

ID 4025

4_2 0 0.2

0 360

ID 4026

4_3 0 0.2 0.4

0 360

ID 4027

4_4 0 0.25 0.5

0 360

ID 4028

4_5 0 0.5 1

0 360

ID 4029

4_6 0 0.5 1

0 360

ID 4030

4_7 0 0.2 0.4

0 360

ID 4031

4_8 -1 0 1

0 360

ID 4032

5_1 0 0.1

0 360

ID 4033

5_2 0 0.1 0.2

0 360

ID 4034

5_3 0 0.1 0.2

0 360

ID 4035

5_4 0 0.25 0.5

0 360

ID 4036

5_5 0 0.5

0 360

ID 4037

5_6 0 0.5

0 360

ID 4038

5_7 0 0.2 0.4

0 360

ID 4039

5_8 0 0.2 0.4

0 360

ID 4040

6_1 -1 0 1

0 360

ID 4041

6_2 0 0.1 0.2

0 360

ID 4042

6_3 0 0.1

0 360

ID 4043

6_4 0 0.2

0 360

ID 4044

6_5 0 0.5

0 360

ID 4045

6_6 0 0.25 0.5

0 360

ID 4046

6_7 0 0.2 0.4

0 360

ID 4047

6_8 0 0.2

0 360

ID 4048

1_1

LD_2,Q^2=0.65,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

-1 0 1

0 360

ID 4001

1_2

0 1

0 360

ID 4002

1_3

-1 -0.5 0

0 360

ID 4003

1_4

0 2

0 360

ID 4004

1_5

0 2

0 360

ID 4005

1_6 -1 0 1

0 360

ID 4006

1_7 -1 0 1

0 360

ID 4007

1_8 -1 0 1

0 360

ID 4008

2_1 0 1 2

0 360

ID 4009

2_2 0 2.5 5

0 360

ID 4010

2_3 0 20 40

0 360

ID 4011

2_4 0 20 40

0 360

ID 4012

2_5 0 5 10

0 360

ID 4013

2_6 0 2 4

0 360

ID 4014

2_7 -1 0 1

0 360

ID 4015

2_8 -1 0 1

0 360

ID 4016

3_1 0 2

0 360

ID 4017

3_2 0 10 0 360

ID 4018

3_3 0 25 50

0 360

ID 4019

3_4 0 100

0 360

ID 4020

3_5 0 100 200

0 360

ID 4021

3_6 0 20 40

0 360

ID 4022

3_7 -1.8519

-0.7017

0.4485

1.5988

0 360

ID 4023

3_8 0 1 2

0 360

ID 4024

4_1 0 2

0 360

ID 4025

4_2 0 10

0 360

ID 4026

4_3 0 20 40

0 360

ID 4027

4_4 0 50

0 360

ID 4028

4_5 0 100

0 360

ID 4029

4_6 0 100 200

0 360

ID 4030

4_7

0

50

0 360

ID 4031

4_8

0

2.5

5

0 360

ID 4032

5_1

-1

0

1

0 360

ID 4033

5_2

0

5

0 360

ID 4034

5_3

0

10

20

0 360

ID 4035

5_4

0

20

40

0 360

ID 4036

5_5

0

25

50

0 360

ID 4037

5_6

0

50

100

0 360

ID 4038

5_7

0

50

100

0 360

ID 4039

5_8

0

20

0 360

ID 4040

6_1

0

1

2

0 360

ID 4041

6_2

0

2.5

5

0 360

ID 4042

6_3

0

5

10

0 360

ID 4043

6_4

0

10

20

0 360

ID 4044

6_5

0

20

40

0 360

ID 4045

6_6

0

20

40

0 360

ID 4046

6_7

0

25

50

0 360

ID 4047

6_8

0

20

40

0 360

ID 4048