LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.48

6_86_8

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2989E-01/ 7 Constant 3.700 Mean 0.3166E-02 Sigma 0.8639E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2072E-01/ 6 Constant 3.739 Mean -0.1802E-03 Sigma 0.8053E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0

0.5

1

1.5

0 100 200 300

2012/01/09 10.48

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0

0.2

0.4

0.6

0 100 200 300 5 0

0.1

0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.48

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8450E-02/ 7 Constant 3.292 Mean 0.2805E-02 Sigma 0.9222E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8013E-02/ 6 Constant 3.325 Mean -0.1449E-03 Sigma 0.8504E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2012/01/09 10.48

1 0

1

2

3

4

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.49

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3879E-02/ 7 Constant 2.285 Mean 0.2486E-02 Sigma 0.1087E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4448E-02/ 6 Constant 2.308 Mean -0.4664E-04 Sigma 0.9781E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/01/09 10.49

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 1 2 3 4

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.49

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3195E-01/ 7 Constant 14.92 Mean 0.7440E-02 Sigma 0.6679E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1252 / 6 Constant 14.81 Mean 0.6147E-03 Sigma 0.7484E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

6

0 100 200 300

2012/01/09 10.49

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

0 100 200 300 5 0

1

2

3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

5

10

15

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.49

6

0

5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7940E-01/ 7 Constant 18.67 Mean 0.7126E-02 Sigma 0.6497E-02

0

5

10

15

20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6299E-01/ 6 Constant 18.38 Mean 0.4120E-03 Sigma 0.7261E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/01/09 10.49

1 0

5

10

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.49

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9476E-01/ 7 Constant 15.01 Mean 0.6621E-02 Sigma 0.7372E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6161E-01/ 6 Constant 14.73 Mean 0.4743E-03 Sigma 0.8547E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0 0.5 1 1.5 2

0 100 200 300

2012/01/09 10.49

1 0

5

10

15

0 100 200 300 2

0

5

10

15

0 100 200 300 3 0 2.5 5 7.5 10

0 100 200 300 4

0

2

4

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.49

6

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2372E-01/ 7 Constant 9.442 Mean 0.5554E-02 Sigma 0.8912E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1818E-01/ 6 Constant 9.370 Mean 0.8006E-04 Sigma 0.9471E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0.06

0 100 200 300

2012/01/09 10.49

1 0

1

2

0 100 200 300 2

0

5

10

15

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0

2

4

6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.50

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1475E-01/ 7 Constant 4.150 Mean 0.5981E-02 Sigma 0.8067E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4034E-02/ 6 Constant 4.089 Mean 0.1552E-03 Sigma 0.8879E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

1.5

0 100 200 300

2012/01/09 10.50

1 0

1

2

3

0 100 200 300 2

0

1

2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.50

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2597E-02/ 7 Constant 2.546 Mean 0.5641E-02 Sigma 0.1028E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9953E-03/ 6 Constant 2.533 Mean 0.5609E-04 Sigma 0.1085E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/01/09 10.50

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0 0.5

1 1.5

2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.50

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7958E-02/ 7 Constant 7.525 Mean 0.6212E-02 Sigma 0.8908E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8511E-02/ 6 Constant 7.486 Mean 0.9743E-04 Sigma 0.9289E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0 1 2 3 4

0 100 200 300

2012/01/09 10.50

1 0

2

4

6

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

6

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.51

6

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3449E-01/ 7 Constant 12.82 Mean 0.6122E-02 Sigma 0.7696E-02

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4206E-01/ 6 Constant 12.66 Mean 0.2860E-03 Sigma 0.8415E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/01/09 10.51

1 0

2.5

5

7.5

10

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.51

6

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1449E-01/ 7 Constant 6.800 Mean 0.5275E-02 Sigma 0.1112E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2165E-01/ 6 Constant 6.803 Mean 0.9829E-04 Sigma 0.1112E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/01/09 10.51

1 0

0.5

1

1.5

2

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0

5

10

0 100 200 300 4

0 2.5 5 7.5 10

0 100 200 300 5 0

2

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.51

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2284E-02/ 7 Constant 0.9870 Mean 0.6167E-02 Sigma 0.1029E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1680E-02/ 6 Constant 0.9830 Mean 0.2217E-03 Sigma 0.1114E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0

0.2

0.4

0.6

0 100 200 300

2012/01/09 10.51

1 0

0.25

0.5

0.75

1

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0 0.025

0.05

0.075 0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.51

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5825E-03/ 7 Constant 0.6709 Mean 0.5551E-02 Sigma 0.1223E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4590E-03/ 6 Constant 0.6695 Mean 0.2519E-03 Sigma 0.1263E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0 0.002

0.004

0.006

0.008

0 100 200 300

2012/01/09 10.51

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.25 0.5 0.75 1

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.52

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2932E-02/ 7 Constant 2.387 Mean 0.6045E-02 Sigma 0.1072E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3530E-02/ 6 Constant 2.386 Mean 0.3203E-03 Sigma 0.1126E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

0.5

1

1.5

0 100 200 300

2012/01/09 10.52

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

0 100 200 300 4

0 0.5 1 1.5 2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.52

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5489E-02/ 7 Constant 3.826 Mean 0.4969E-02 Sigma 0.1020E-01

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4272E-02/ 6 Constant 3.817 Mean -0.5829E-04 Sigma 0.1045E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=0,π^+

0

1

2

0 100 200 300

2012/01/09 10.52

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.52

6

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2410E-02/ 7 Constant 2.214 Mean 0.4196E-02 Sigma 0.1292E-01

0 0.5 1 1.5 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2932E-02/ 6 Constant 2.222 Mean 0.6592E-04 Sigma 0.1218E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/01/09 10.52

1 0

0.5

1

0 100 200 300 2

0

2

4

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.52

6

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4812E-03/ 16 Constant 0.2419 Mean 0.1037E-01 Sigma 0.1599E-01

0

0.1

0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6332E-03/ 13 Constant 0.2401 Mean 0.2298E-03 Sigma 0.1664E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=0,π^+

0 0.05 0.1 0.15 0.2

0 100 200 300

2012/01/09 10.52

1 0

0.1

0.2

0 100 200 300 2

0 0.05 0.1 0.15 0.2

0 100 200 300 3 0

0.05

0.1

0.15

0 100 200 300 4

0 0.025

0.05

0.075 0.1

0 100 200 300 5 0

0.02

0.04

0.06

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.53

6

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7621E-03/ 16 Constant 0.1999 Mean 0.8905E-02 Sigma 0.1765E-01

0 0.05 0.1 0.15 0.2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6207E-03/ 13 Constant 0.1971 Mean 0.1563E-03 Sigma 0.1886E-01

MissMass

LD_2,Q^2=1.6,ε=0.27,θ_{pq}=4,π^+

0

0.01

0.02

0.03

0 100 200 300

2012/01/09 10.53

1 0

0.1

0.2

0 100 200 300 2

0

0.2

0.4

0 100 200 300 3 0

0.2

0.4

0 100 200 300 4

0 0.1 0.2 0.3 0.4

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.53

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5198E-02/ 16 Constant 0.6556 Mean 0.9555E-02 Sigma 0.1661E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1607E-02/ 13 Constant 0.6529 Mean -0.1057E-03 Sigma 0.1725E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=-4,π^+

0 0.2 0.4 0.6 0.8

0 100 200 300

2012/01/09 10.53

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 0.25 0.5 0.75 1

0 100 200 300 3 0

0.25

0.5

0.75

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.53

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5808E-02/ 16 Constant 0.9924 Mean 0.9495E-02 Sigma 0.1571E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4610E-02/ 13 Constant 0.9908 Mean -0.1641E-06 Sigma 0.1577E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=0,π^+

0

0.5

1

0 100 200 300

2012/01/09 10.53

1 0 0.25 0.5 0.75 1

0 100 200 300 2

0 0.2 0.4 0.6 0.8

0 100 200 300 3 0

0.2

0.4

0.6

0 100 200 300 4

0

0.1

0.2

0.3

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/01/09 10.53

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3785E-02/ 16 Constant 0.6926 Mean 0.7068E-02 Sigma 0.1790E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.3848E-02/ 13 Constant 0.6896 Mean -0.9645E-04 Sigma 0.1826E-01

MissMass

LD_2,Q^2=1.6,ε=0.63,θ_{pq}=4,π^+

0

0.05

0.1

0 100 200 300

2012/01/09 10.53

1 0 0.25 0.5

0.75 1

0 100 200 300 2

0

0.5

1

1.5

0 100 200 300 3 0 0.5 1 1.5 2

0 100 200 300 4

0

0.5

1

0 100 200 300 5 0

0.2

0.4

0.6

0 100 200 300

6 ϕ_{πq}