missmass

’Run 17259’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0 2 4 6 8 10 12 14

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 5 10 15 20 25 30 35

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17259’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17259’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

phi_pq 0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

missmass

’Run 17257’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 10 20 30 40 50 60 70 80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17257’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17257’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

missmass

’Run 17258’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 200 400 600 800 1000

1200

1400

1600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

500

1000

1500

2000

2500

3000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17258’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.35 0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17258’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=0.522^o,π^+,Tgt=1

0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

missmass

’Run 17260’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

0 2 4 6 8 10 12 14

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 5 10 15 20 25 30 35

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17260’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.45 0.5 0.55 0.6 0.65 0.7 0.75

W VS. Q2

ID 1000000

phi_pq

’Run 17260’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0 0.2 0.4 0.6 0.8

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0 100 200 300

ID 101

missmass

’Run 17261’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 5 10 15 20 25 30 35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

10

20

30

40

50

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17261’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17261’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

missmass

’Run 17263’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 200 400 600 800 1000

1200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

500

1000

1500

2000

2500

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17263’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

2.075

2.1

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17263’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

missmass

’Run 17264’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 25 50 75 100 125 150 175 200 225

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17264’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17264’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

10

20

30

40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17268’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17268’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17268’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

missmass

’Run 17278’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 250 500 750 1000

1250

1500

1750

2000

2250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 500 1000

1500

2000

2500

3000

3500

4000

4500

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17278’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17278’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 50

100 150

200

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0

250

500

750

1000

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

missmass

’Run 17280’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0 20 40 60 80 100 120 140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17280’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

W VS. Q2

ID 1000000

phi_pq

’Run 17280’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=2^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17291’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

0

2

4

6

8

10

12

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

5

10

15

20

25

30

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17291’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8

W VS. Q2

ID 1000000

phi_pq

’Run 17291’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0 0.2 0.4 0.6 0.8

0 100 200 300

ID 101

phi_pq 0

0.5

1

0 100 200 300

ID 101

phi_pq 0 0.25 0.5 0.75 1

0 100 200 300

ID 101

missmass

’Run 17288’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17288’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17288’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

missmass

’Run 17289’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17289’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17289’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

missmass

’Run 17290’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800 900

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

1600

1800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17290’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17290’,LD_2,Q^2=0.6,ε=0.37,Θ_{pq}=4^o,π^+,Tgt=1

0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

missmass

’Run 17017’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0 20 40 60 80 100 120 140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17017’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17017’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=0

0

1

2

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

missmass

’Run 17018’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 25 50 75 100 125 150 175 200 225

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17018’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17018’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

missmass

’Run 17019’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 25 50 75 100 125 150 175 200 225

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17019’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17019’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17020’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

50

100

150

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17020’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17020’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17021’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400 450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17021’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17021’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17022’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17022’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17022’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=-2.77^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

missmass

’Run 17016’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

50

100

150

200

250

300

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17016’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17016’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=0

0 0.25 0.5 0.75 1

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

missmass

’Run 17013’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

200

400

600

800

1000

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17013’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17013’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

missmass

’Run 17014’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17014’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17014’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 17015’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17015’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17015’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

missmass

’Run 17038’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 10 20 30 40 50 60 70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 25 50 75 100 125 150 175 200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17038’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17038’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.1 0.2 0.3 0.4

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

missmass

’Run 17039’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 2 4 6 8 10 12 14

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

5

10

15

20

25

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17039’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17039’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=0

0 0.05 0.1 0.15 0.2

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.2

0.4 0.6

0.8

0 100 200 300

ID 101

phi_pq 0 0.2 0.4 0.6 0.8

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

missmass

’Run 17031’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

100

200

300

400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17031’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17031’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17032’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400 450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800 900

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17032’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17032’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

missmass

’Run 17033’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 10 20 30 40 50 60 70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17033’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17033’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

missmass

’Run 17037’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350 400 450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17037’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17037’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=2^o,π^+,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17040’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=0

0 5 10 15 20 25 30 35 40 45

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17040’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17040’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=0

0 0.05 0.1 0.15 0.2

0 100 200 300

ID 101

phi_pq 0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0 1

2 3

4

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

missmass

’Run 17041’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

0

20

40

60

80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140 160

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17041’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 17041’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17042’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

0

200

400

600

800

1000

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

1600

1800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17042’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17042’,LD_2,Q^2=0.6,ε=0.74,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

missmass

’Run 16854’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=0

0 5 10 15 20 25 30 35 40

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 20 40 60 80 100 120 140

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16854’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=0

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1

W VS. Q2

ID 1000000

phi_pq

’Run 16854’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=0

0 0.25 0.5 0.75 1

0 100 200 300

ID 101

phi_pq 0

0.5

1

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

0.5

1

0 100 200 300

ID 101

phi_pq 0 0.2

0.4

0.6 0.8

0 100 200 300

ID 101

missmass

’Run 16852’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16852’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1

W VS. Q2

ID 1000000

phi_pq

’Run 16852’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

20

40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 16853’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

2250

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16853’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 16853’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 16870’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0 20 40 60 80 100 120 140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300 350

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16870’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 16870’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

missmass

’Run 16871’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0

200

400

600

800

1000

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

500

1000

1500

2000

2500

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16871’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 16871’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

20

40

60

80

0 100 200 300

ID 101

missmass

’Run 16855’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 0.25 0.5 0.75 1 1.25 1.5 1.75 2

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

ID 1000000

’Run 16855’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

0.65 0.675 0.7 0.725 0.75 0.775 0.8 0.825 0.85 0.875 0.9

W VS. Q2

ID 1000000

phi_pq

’Run 16855’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq -1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq -1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq 0 0.05 0.1 0.15 0.2

0 100 200 300

ID 101

missmass

’Run 16856’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

0 2.5 5 7.5 10 12.5 15 17.5 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 10 20 30 40 50 60 70 80 90

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16856’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

1.8

1.825

1.85

1.875

1.9

1.925

1.95

1.975

2

2.025

2.05

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1

W VS. Q2

ID 1000000

phi_pq

’Run 16856’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=0

-1 -0.5 0 0.5 1

0 100 200 300

ID 101

phi_pq 0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq 0 0.25 0.5 0.75 1

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq 0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0

1

2

0 100 200 300

ID 101

missmass

’Run 16857’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0

200

400

600

800

1000

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

500

1000

1500

2000

2500

3000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16857’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 16857’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

200

400

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0

200

400

600

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

missmass

’Run 16858’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0 100 200 300 400 500 600 700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16858’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 16858’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0 100 200 300 400

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

missmass

’Run 16859’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16859’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 16859’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

missmass

’Run 16860’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16860’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 16860’,LD_2,Q^2=0.75,ε=0.43,Θ_{pq}=4^o,π^+,Tgt=1

0 0.5 1 1.5 2

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

missmass

’Run 17082’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=0

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

50

100

150

200

250

300

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17082’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17082’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=0

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq 0

1

2

3

4

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

6

0 100 200 300

ID 101

phi_pq 0

2

4

0 100 200 300

ID 101

missmass

’Run 17074’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 5 10 15 20 25 30 35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

10

20

30

40

50

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17074’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95

W VS. Q2

ID 1000000

phi_pq

’Run 17074’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq 0 2.5 5 7.5 10

0 100 200 300

ID 101

phi_pq 0

5

10

15

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0

5

10

0 100 200 300

ID 101

phi_pq 0 2 4 6 8

0 100 200 300

ID 101

missmass

’Run 17075’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 10 20 30 40 50 60

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17075’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17075’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

phi_pq 0

10

20

0 100 200 300

ID 101

phi_pq 0 5 10 15 20

0 100 200 300

ID 101

missmass

’Run 17076’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 50 100 150 200 250 300 350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700 800

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17076’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17076’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

25

50

75

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

25

50

75

100

0 100 200 300

ID 101

missmass

’Run 17077’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

100

200

300

400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17077’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17077’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

missmass

’Run 17078’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

1600

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17078’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17078’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

missmass

’Run 17079’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 100 200 300 400 500 600 700 800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 200 400 600 800 1000

1200

1400

1600

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17079’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17079’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

missmass

’Run 17080’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17080’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1

W VS. Q2

ID 1000000

phi_pq

’Run 17080’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

missmass

’Run 17081’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400 450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17081’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17081’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=-4^o,π^+,Tgt=1

0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

missmass

’Run 17054’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=0

0 10 20 30 40 50 60 70 80 90

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 50 100 150 200 250 300

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17054’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17054’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=0

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0 1 2 3 4

0 100 200 300

ID 101

phi_pq 0

1

2

3

0 100 200 300

ID 101

phi_pq 0

0.5

1

1.5

2

0 100 200 300

ID 101

missmass

’Run 17055’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0 50 100 150 200 250 300 350 400 450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 100 200 300 400 500 600 700

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17055’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17055’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

phi_pq 0 10 20 30 40

0 100 200 300

ID 101

phi_pq 0

10

20

30

0 100 200 300

ID 101

missmass

’Run 17056’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

200

400

600

800

1000

1200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

2250

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17056’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17056’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

200

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

missmass

’Run 17057’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

100

200

300 400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17057’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17057’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq 0 50 100 150 200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0 25 50 75 100

0 100 200 300

ID 101

phi_pq 0 25 50

75 100

0 100 200 300

ID 101

phi_pq 0

20

40

60

0 100 200 300

ID 101

missmass

’Run 17058’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

200

400

600

800

1000

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime 0 250 500 750 1000

1250

1500

1750

2000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17058’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000

phi_pq

’Run 17058’,LD_2,Q^2=0.75,ε=0.7,Θ_{pq}=0^o,π^+,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq 0

100

200

300

0 100 200 300

ID 101

phi_pq 0

100

200

0 100 200 300

ID 101

phi_pq 0

50

100

150

0 100 200 300

ID 101

phi_pq 0

50

100

0 100 200 300

ID 101

phi_pq 0 20 40 60 80

0 100 200 300

ID 101

missmass

’Run 17059’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

400

450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17059’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000 phi_pq

’Run 17059’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17060’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17060’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000 phi_pq

’Run 17060’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101 missmass

’Run 17052’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

0

1

2

3

4

5

6

7

8

9

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

2

4

6

8

10

12

-4 -2 0 2 4 6 8

ID 1000000

’Run 17052’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

W VS. Q2

ID 1000000 phi_pq

’Run 17052’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101 missmass

’Run 17053’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

0

10

20

30

40

50

60

70

80

90

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

25

50

75

100

125

150

175

200

225

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17053’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 17053’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

1

2

3

4

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101 missmass

’Run 17046’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17046’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 17046’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101 missmass

’Run 17047’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

700

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17047’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 17047’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101 missmass

’Run 17049’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17049’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 17049’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17050’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17050’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 17050’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101 missmass

’Run 17051’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

700

800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17051’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 17051’,LD

2

,Q

2

=0.75,ε=0.7,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

200

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101 missmass

’Run 16925’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=0

0

2

4

6

8

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

2

4

6

8

10

12

14

16

-6 -4 -2 0 2 4 6 8

ID 1000000

’Run 16925’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 16925’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=0

0

0.1

0.2

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0.4

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0.4

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101 missmass

’Run 16926’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16926’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 16926’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 16927’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16927’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 16927’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 16931’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=0

0

1

2

3

4

5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

2

4

6

8

10

12

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16931’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=0

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

W VS. Q2

ID 1000000 phi_pq

’Run 16931’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=0

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0.4

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0 100 200 300

ID 101 missmass

’Run 16928’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16928’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 16928’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101 missmass

’Run 16929’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

160

180

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

450

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 16929’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 16929’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101 missmass

’Run 16930’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 16930’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 16930’,LD

2

,Q

2

=1,ε=0.33,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101 missmass

’Run 17083’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=0

0

2

4

6

8

10

12

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

5

10

15

20

25

30

35

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17083’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 17083’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=0

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101 missmass

’Run 17088’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

400

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17088’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 17088’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17089’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

400

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17089’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 17089’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17090’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

225

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17090’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 17090’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=-4 o

,π

+

,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17113’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=0

0

5

10

15

20

25

30

35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

80

90

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17113’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 17113’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=0

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101 missmass

’Run 17094’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

700

800

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

250

500

750

1000

1250

1500

1750

2000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17094’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

W VS. Q2

ID 1000000 phi_pq

’Run 17094’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17095’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

140

160

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17095’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

W VS. Q2

ID 1000000 phi_pq

’Run 17095’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101 missmass

’Run 17096’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17096’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 17096’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17100’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17100’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

W VS. Q2

ID 1000000 phi_pq

’Run 17100’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101 missmass

’Run 17115’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=0

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17115’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

W VS. Q2

ID 1000000 phi_pq

’Run 17115’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101 missmass

’Run 17120’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

600

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17120’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.6 0.8 1 1.2 1.4 1.6

W VS. Q2

ID 1000000 phi_pq

’Run 17120’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101 missmass

’Run 17121’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17121’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

W VS. Q2

ID 1000000 phi_pq

’Run 17121’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101 missmass

’Run 17122’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17122’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

W VS. Q2

ID 1000000 phi_pq

’Run 17122’,LD

2

,Q

2

=1,ε=0.65,Θ

pq

=4 o

,π

+

,Tgt=1

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101 missmass

’Run 17196’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=0

0

1

2

3

4

5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

1

2

3

4

5

6

-1 0 1 2 3 4 5 6 7 8 9

ID 1000000

’Run 17196’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17196’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=0

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.1

0.2

0.3

0 100 200 300

ID 101 missmass

’Run 17187’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

40

45

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17187’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17187’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101 missmass

’Run 17188’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17188’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17188’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101 missmass

’Run 17189’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17189’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17189’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101 missmass

’Run 17190’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

160

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17190’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17190’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101 missmass

’Run 17191’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

25

50

75

100

125

150

175

200

225

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17191’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17191’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101 missmass

’Run 17192’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17192’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17192’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101 missmass

’Run 17199’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

2

4

6

8

10

12

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

2.5

5

7.5

10

12.5

15

17.5

20

22.5

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17199’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17199’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

2

4

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

0 100 200 300

ID 101

phi_pq

0

2

4

0 100 200 300

ID 101

phi_pq

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

1

2

3

0 100 200 300

ID 101 missmass

’Run 17200’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17200’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17200’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

0 100 200 300

ID 101

phi_pq

0

2

4

0 100 200 300

ID 101 missmass

’Run 17201’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

140

160

180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17201’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17201’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101 missmass

’Run 17202’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17202’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17202’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101 missmass

’Run 17203’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17203’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17203’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101 missmass

’Run 17204’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

40

45

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17204’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17204’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101 missmass

’Run 17205’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17205’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17205’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17206’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

90

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17206’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17206’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101 missmass

’Run 17207’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

80

90

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17207’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17207’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101 missmass

’Run 17218’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.5

1

1.5

2

2.5

3

3.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

0.2

0.4

0.6

0.8

1

-4.5 -4 -3.5 -3 -2.5 -2 -1.5 -1 -0.5 0 0.5

ID 1000000

’Run 17218’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=0

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

1.4 1.45 1.5 1.55 1.6 1.65 1.7

W VS. Q2

ID 1000000 phi_pq

’Run 17218’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101 missmass

’Run 17219’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

80

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17219’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17219’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

0.5

1

1.5

2

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101 missmass

’Run 17220’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17220’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17220’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101 missmass

’Run 17221’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

160

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17221’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17221’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101 missmass

’Run 17223’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

160

180

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17223’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2 2.1

W VS. Q2

ID 1000000 phi_pq

’Run 17223’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101 missmass

’Run 17224’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17224’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17224’,LD

2

,Q

2

=1.6,ε=0.27,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17422’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

0

0.5

1

1.5

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

0.25

0.5

0.75

1

1.25

1.5

1.75

2

-4 -2 0 2 4 6 8 10

ID 1000000

’Run 17422’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

1.85

1.9

1.95

2

2.05

2.1

2.15

1.2 1.3 1.4 1.5 1.6 1.7 1.8

W VS. Q2

ID 1000000 phi_pq

’Run 17422’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

0

0.05

0.1

0.15

0.2

0 100 200 300

ID 101

phi_pq

-1

-0.5

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

0

0.05

0.1

0.15

0 100 200 300

ID 101

phi_pq

-1

-0.5

0

0.5

1

0 100 200 300

ID 101 missmass

’Run 17423’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

0

2

4

6

8

10

12

14

16

18

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17423’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17423’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=0

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.5

1

1.5

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101 missmass

’Run 17411’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

140

160

180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17411’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17411’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101 missmass

’Run 17412’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

800

900

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17412’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17412’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17414’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17414’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17414’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17415’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

20

40

60

80

100

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17415’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17415’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101 missmass

’Run 17416’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

25

50

75

100

125

150

175

200

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17416’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17416’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101 missmass

’Run 17417’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

25

50

75

100

125

150

175

200

225

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17417’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17417’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101 missmass

’Run 17418’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

800

900

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17418’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

2.25

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17418’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17419’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

800

900

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17419’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17419’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101 missmass

’Run 17420’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

80

90

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17420’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17420’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101 missmass

’Run 17421’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17421’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17421’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=-4 o

,π

+

,Tgt=1

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17395’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=0

0

2.5

5

7.5

10

12.5

15

17.5

20

22.5

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17395’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=0

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17395’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=0

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0.8

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0.8

0 100 200 300

ID 101 missmass

’Run 17377’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

5

10

15

20

25

30

35

0 2 4 6 8 10

ID 1000000

’Run 17377’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2

W VS. Q2

ID 1000000 phi_pq

’Run 17377’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101

phi_pq

0

2

4

6

0 100 200 300

ID 101 missmass

’Run 17378’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

25

30

35

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

10

20

30

40

50

60

70

80

90

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17378’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17378’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101 missmass

’Run 17379’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

100

200

300

400

500

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

1400

1600

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17379’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.7

1.8

1.9

2

2.1

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17379’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101 missmass

’Run 17380’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

800

900

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17380’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17380’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17384’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17384’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.7

1.8

1.9

2

2.1

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17384’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17385’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

25

50

75

100

125

150

175

200

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17385’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

W VS. Q2

ID 1000000 phi_pq

’Run 17385’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101 missmass

’Run 17386’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17386’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.7

1.8

1.9

2

2.1

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17386’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17387’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17387’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17387’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=0 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

20

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101 missmass

’Run 17374’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=0

0

2

4

6

8

10

12

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

5

10

15

20

25

30

35

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17374’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=0

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17374’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=0

0

0.1

0.2

0.3

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0.8

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0.8

0 100 200 300

ID 101

phi_pq

0

0.5

1

0 100 200 300

ID 101

phi_pq

0

0.2

0.4

0.6

0.8

0 100 200 300

ID 101

phi_pq

0

0.25

0.5

0.75

1

0 100 200 300

ID 101 missmass

’Run 17351’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

2

4

6

8

10

12

14

16

18

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

5

10

15

20

25

30

35

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17351’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17351’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2

4

6

8

0 100 200 300

ID 101 missmass

’Run 17352’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17352’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.8

1.9

2

2.1

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17352’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101 missmass

’Run 17368’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

20

25

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

5

10

15

20

25

30

35

40

45

-6 -4 -2 0 2 4 6 8

ID 1000000

’Run 17368’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2

W VS. Q2

ID 1000000 phi_pq

’Run 17368’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

2.5

5

7.5

10

0 100 200 300

ID 101 missmass

’Run 17369’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

700

800

900

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17369’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.8

1.9

2

2.1

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17369’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

100

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101 missmass

’Run 17370’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

100

200

300

400

500

600

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17370’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17370’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

20

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101 missmass

’Run 17371’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17371’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17371’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

100

200

0 100 200 300

ID 101

phi_pq

0

100

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101 missmass

’Run 17372’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

50

100

150

200

250

300

350

400

450

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

200

400

600

800

1000

1200

-6 -4 -2 0 2 4 6 8 10 12

ID 1000000

’Run 17372’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17372’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

0 100 200 300

ID 101

phi_pq

0

50

100

150

200

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

400

0 100 200 300

ID 101

phi_pq

0

100

200

300

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101 missmass

’Run 17373’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

10

20

30

40

50

60

70

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

20

40

60

80

100

120

140

160

180

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17373’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17373’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

1

2

3

0 100 200 300

ID 101

phi_pq

0

10

20

30

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101

phi_pq

0

10

20

30

40

0 100 200 300

ID 101 missmass

’Run 17375’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

20

40

60

80

100

120

140

160

180

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1

ID 2000

cointime

0

50

100

150

200

250

300

350

400

-6 -4 -2 0 2 4 6 8 10

ID 1000000

’Run 17375’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

2.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2

W VS. Q2

ID 1000000 phi_pq

’Run 17375’,LD

2

,Q

2

=1.6,ε=0.63,Θ

pq

=4 o

,π

+

,Tgt=1

0

5

10

15

0 100 200 300

ID 101

phi_pq

0

20

40

60

80

0 100 200 300

ID 101

phi_pq

0

50

100

150

0 100 200 300

ID 101

phi_pq

0

50

100

0 100 200 300

ID 101

phi_pq

0

25

50

75

100

0 100 200 300

ID 101

phi_pq

0

20

40

60

0 100 200 300

ID 101