LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 19.31

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.9251E-01/ 7 Constant 3.958 Mean 0.4197E-02 Sigma 0.6841E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5098E-01/ 6 Constant 3.938 Mean -0.1981E-03 Sigma 0.6947E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

2012/03/06 19.31

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=0.522,π^+

0 0.25 0.5 0.75 1

0 100 200 300

2012/03/06 19.36

1 0

1

2

3

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0 0.25 0.5 0.75 1

0 100 200 300 4

0

0.2

0.4

0 100 200 300 5 0 0.05 0.1 0.15 0.2

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 19.37

6

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4652E-01/ 7 Constant 3.470 Mean 0.4001E-02 Sigma 0.7449E-02

0

1

2

3

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2792E-01/ 6 Constant 3.480 Mean -0.2166E-03 Sigma 0.7309E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

2012/03/06 19.37

6

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=2,π^+

0

0.2

0.4

0.6

0 100 200 300

2012/03/06 19.46

1 0

1

2

3

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

0.5

1

1.5

2

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0

0.1

0.2

0.3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 19.47

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1314E-01/ 7 Constant 2.350 Mean 0.3782E-02 Sigma 0.8944E-02

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7084E-02/ 6 Constant 2.356 Mean -0.1728E-03 Sigma 0.8748E-02

MissMass

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

2.04

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85

2012/03/06 19.47

6

LD_2,Q^2=0.6,ε=0.37,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/06 19.56

1 0

0.2

0.4

0.6

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0

1

2

3

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 19.57

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2611 / 7 Constant 15.02 Mean 0.4294E-02 Sigma 0.6824E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1768 / 6 Constant 15.01 Mean -0.1690E-03 Sigma 0.6784E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9

2012/03/06 19.57

6

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=-2.77,π^+

0

2

4

6

0 100 200 300

2012/03/06 20.03

1 0 2.5 5 7.5 10

0 100 200 300 2

0 2.5 5 7.5 10

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0

2

4

0 100 200 300 5 0

1

2

3

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 20.03

6

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4312 / 7 Constant 19.28 Mean 0.4327E-02 Sigma 0.6707E-02

0 5 10 15 20

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1616 / 6 Constant 19.13 Mean -0.2406E-03 Sigma 0.6868E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2012/03/06 20.03

6

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=0,π^+

0

2

4

6

0 100 200 300

2012/03/06 20.09

1 0

5

10

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0

2

4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 20.09

6

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2417 / 7 Constant 15.66 Mean 0.4015E-02 Sigma 0.7643E-02

0

5

10

15

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1637 / 6 Constant 15.61 Mean -0.1860E-03 Sigma 0.7676E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2012/03/06 20.09

6

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=2,π^+

0

1

2

0 100 200 300

2012/03/06 20.20

1 0

5

10

15

0 100 200 300 2

0

5

10

15

0 100 200 300 3 0 2 4 6 8

0 100 200 300 4

0 1 2 3 4

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 20.20

6

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2432E-01/ 7 Constant 9.735 Mean 0.4922E-02 Sigma 0.8439E-02

0 2.5 5 7.5 10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1190E-01/ 6 Constant 9.707 Mean -0.5049E-04 Sigma 0.8585E-02

MissMass

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2012/03/06 20.20

6

LD_2,Q^2=0.6,ε=0.74,θ_{pq}=4,π^+

0

0.02

0.04

0 100 200 300

2012/03/06 20.33

1 0 0.5 1 1.5 2

0 100 200 300 2

0

5

10

0 100 200 300 3 0

5

10

15

0 100 200 300 4

0

2.5

5

7.5

10

0 100 200 300 5 0

2

4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 20.33

6

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1899E-01/ 7 Constant 4.217 Mean 0.3899E-02 Sigma 0.8240E-02

0 1 2 3 4

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7760E-02/ 6 Constant 4.225 Mean -0.1554E-03 Sigma 0.8118E-02

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

0.5 0.6 0.7 0.8 0.9 1 1.1

2012/03/06 20.33

6

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=0,π^+

0

0.5

1

1.5

0 100 200 300

2012/03/06 20.48

1 0

1

2

0 100 200 300 2

0 0.5 1 1.5 2

0 100 200 300 3 0

0.5

1

1.5

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 20.48

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5131E-02/ 7 Constant 2.595 Mean 0.3427E-02 Sigma 0.1041E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2961E-02/ 6 Constant 2.603 Mean -0.1450E-03 Sigma 0.1006E-01

MissMass

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

0.5 0.6 0.7 0.8 0.9 1 1.1

2012/03/06 20.48

6

LD_2,Q^2=0.75,ε=0.43,θ_{pq}=4,π^+

0 0.005

0.01

0.015

0.02

0 100 200 300

2012/03/06 20.59

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

1

2

3

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

3

0 100 200 300 5 0

0.5

1

1.5

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.00

6

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5425E-01/ 7 Constant 7.509 Mean 0.3630E-02 Sigma 0.9031E-02

0 2 4 6 8

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2680E-01/ 6 Constant 7.563 Mean -0.2082E-03 Sigma 0.8589E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

2012/03/06 21.00

6

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=-4,π^+

0

1

2

3

0 100 200 300

2012/03/06 21.07

1 0

2

4

6

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0

2

4

6

0 100 200 300 4

0

2

4

0 100 200 300 5 0 1

2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.07

6

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.5373E-01/ 7 Constant 13.06 Mean 0.3776E-02 Sigma 0.8174E-02

0

5

10

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4262E-01/ 6 Constant 13.08 Mean -0.1769E-03 Sigma 0.8023E-02

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

2012/03/06 21.07

6

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=0,π^+

0

2

4

0 100 200 300

2012/03/06 21.14

1 0 2 4 6 8

0 100 200 300 2

0

2

4

6

0 100 200 300 3 0 1 2 3 4

0 100 200 300 4

0

1

2

0 100 200 300 5 0

0.5

1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.14

6

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2364E-01/ 7 Constant 6.970 Mean 0.3214E-02 Sigma 0.1048E-01

0

2

4

6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.1305E-01/ 6 Constant 7.006 Mean -0.1576E-03 Sigma 0.1000E-01

MissMass

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

2012/03/06 21.14

6

LD_2,Q^2=0.75,ε=0.7,θ_{pq}=4,π^+

0

0.02

0.04

0.06

0 100 200 300

2012/03/06 21.19

1 0

0.5

1

1.5

0 100 200 300 2

0 2 4 6 8

0 100 200 300 3 0 2.5 5 7.5 10

0 100 200 300 4

0 2 4 6 8

0 100 200 300 5 0 1 2 3 4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.20

6

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.2050E-02/ 7 Constant 0.9795 Mean 0.3533E-02 Sigma 0.1040E-01

0 0.25 0.5 0.75 1

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.7016E-03/ 6 Constant 0.9815 Mean -0.2007E-03 Sigma 0.1004E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

2012/03/06 21.20

6

LD_2,Q^2=1,ε=0.33,θ_{pq}=0,π^+

0

0.2

0.4

0 100 200 300

2012/03/06 21.29

1 0 0.2 0.4 0.6 0.8

0 100 200 300 2

0

0.2

0.4

0.6

0 100 200 300 3 0 0.1 0.2 0.3 0.4

0 100 200 300 4

0

0.1

0.2

0 100 200 300 5 0 0.025

0.05

0.075 0.1

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.29

6

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.6808E-03/ 7 Constant 0.6591 Mean 0.3083E-02 Sigma 0.1278E-01

0

0.2

0.4

0.6

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4929E-03/ 6 Constant 0.6671 Mean 0.2420E-03 Sigma 0.1169E-01

MissMass

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

2012/03/06 21.29

6

LD_2,Q^2=1,ε=0.33,θ_{pq}=4,π^+

0

0.005

0.01

0.015

0 100 200 300

2012/03/06 21.39

1 0 0.1 0.2 0.3 0.4

0 100 200 300 2

0

0.5

1

0 100 200 300 3 0

0.5

1

0 100 200 300 4

0 0.2 0.4 0.6 0.8

0 100 200 300 5 0 0.1 0.2 0.3 0.4

0 100 200 300

6 ϕ_{πq}

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

2012/03/06 21.39

6

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.8467E-02/ 7 Constant 2.366 Mean 0.3157E-02 Sigma 0.1060E-01

0

1

2

-0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125 0.15

0.4197E-02/ 6 Constant 2.378 Mean -0.1633E-03 Sigma 0.1024E-01

MissMass

LD_2,Q^2=1,ε=0.65,θ_{pq}=-4,π^+

1.8

1.85

1.9

1.95

2

2.05

2.1

2.15

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

2012/03/06 21.39

6