Run# 13100 13101 13102 13103 13104 13107 13109 13110 Target 4cmLH2 4cmLH2 4cmLD2 4cmLD2 4cm dummy 4cm dummy 4cmLD2 4cmLD2 Time (min) 17 25 2 34 7 4 8 29 P_{HMS} (GeV/c) +2.323 +2.323 +2.323 +2.323 +2.323 -2.323 -2.323 -2.323 P_{SOS} (GeV/c) -0.835 -0.835 -0.835 -0.835 -0.835 -0.835 -0.835 -0.835 Θ_{HMS} (^ffi) 14.02 14.02 14.02 14.02 14.02 14.02 14.02 14.02 Θ_{SOS} (^ffi) 45.19 45.19 45.19 45.19 45.19 45.19 45.19 45.19 PS1 500 1 1 1 1 1 1 1 HMS (kcounts) 164 29.5 4.8 100 3.4 10.2 100.7 166.8 PS2 20 1 1 1 1 1 1 1 SOS (kcounts) 163 29.4 4.8 100 3.4 10.1 100.4 166 PS3 1 1 1 1 1 1 1 1 COIN (kcounts) 20 30 5 100 3.5 10.5 104.6 172.7 HMS_{trigger} 3/4 3/4 3/4 3/4 3/4 3/4 3/4 3/4 SOS_{trigger} 3/4+PID 3/4+PID 3/4+PID 3/4+PID 3/4+PID 3/4+PID 3/4+PID 3/4+PID